From 3982f4f67314ec37fd9b22ae54049958af777c1b Mon Sep 17 00:00:00 2001
From: jimmydot <jf2512@att.com>
Date: Sun, 7 May 2017 14:58:24 -0400
Subject: [VID-6] Initial rebase push

Change-Id: I9077be9663754d9b22f77c6a7b3109b361b39346
Signed-off-by: jimmydot <jf2512@att.com>
---
 lf_config/vid-pre-init.sql | 64 +++++++++++++++++++++++-----------------------
 1 file changed, 32 insertions(+), 32 deletions(-)

(limited to 'lf_config/vid-pre-init.sql')

diff --git a/lf_config/vid-pre-init.sql b/lf_config/vid-pre-init.sql
index ae1b5aaf0..107b582c6 100644
--- a/lf_config/vid-pre-init.sql
+++ b/lf_config/vid-pre-init.sql
@@ -1,32 +1,32 @@
-/*-
- * ============LICENSE_START=======================================================
- * VID
- * ================================================================================
- * Copyright (C) 2017 AT&T Intellectual Property. All rights reserved.
- * ================================================================================
- * Licensed under the Apache License, Version 2.0 (the "License");
- * you may not use this file except in compliance with the License.
- * You may obtain a copy of the License at
- *
- *      http://www.apache.org/licenses/LICENSE-2.0
- *
- * Unless required by applicable law or agreed to in writing, software
- * distributed under the License is distributed on an "AS IS" BASIS,
- * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
- * See the License for the specific language governing permissions and
- * limitations under the License.
- * ============LICENSE_END=========================================================
- */
-CREATE TABLE IF NOT EXISTS `vid_openecomp`.`schema_info` (
-   `SCHEMA_ID` VARCHAR(25) NOT NULL,
-   `SCHEMA_DESC` VARCHAR(75) NOT NULL,
-   `DATASOURCE_TYPE` VARCHAR(100) NULL DEFAULT NULL,
-   `CONNECTION_URL` VARCHAR(200) NOT NULL,
-   `USER_NAME` VARCHAR(45) NOT NULL,
-   `PASSWORD` VARCHAR(45) NULL DEFAULT NULL,
-   `DRIVER_CLASS` VARCHAR(100) NOT NULL,
-   `MIN_POOL_SIZE` INT(11) NOT NULL,
-   `MAX_POOL_SIZE` INT(11) NOT NULL,
-   `IDLE_CONNECTION_TEST_PERIOD` INT(11) NOT NULL)
-    ENGINE = InnoDB
-    DEFAULT CHARACTER SET = utf8;
+/*-
+ * ============LICENSE_START=======================================================
+ * VID
+ * ================================================================================
+ * Copyright (C) 2017 AT&T Intellectual Property. All rights reserved.
+ * ================================================================================
+ * Licensed under the Apache License, Version 2.0 (the "License");
+ * you may not use this file except in compliance with the License.
+ * You may obtain a copy of the License at
+ * 
+ *      http://www.apache.org/licenses/LICENSE-2.0
+ * 
+ * Unless required by applicable law or agreed to in writing, software
+ * distributed under the License is distributed on an "AS IS" BASIS,
+ * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
+ * See the License for the specific language governing permissions and
+ * limitations under the License.
+ * ============LICENSE_END=========================================================
+ */
+CREATE TABLE IF NOT EXISTS `vid_openecomp_epsdk`.`schema_info` (
+  `SCHEMA_ID` VARCHAR(25) NOT NULL,
+  `SCHEMA_DESC` VARCHAR(75) NOT NULL,
+  `DATASOURCE_TYPE` VARCHAR(100) NULL DEFAULT NULL,
+  `CONNECTION_URL` VARCHAR(200) NOT NULL,
+  `USER_NAME` VARCHAR(45) NOT NULL,
+  `PASSWORD` VARCHAR(45) NULL DEFAULT NULL,
+  `DRIVER_CLASS` VARCHAR(100) NOT NULL,
+  `MIN_POOL_SIZE` INT(11) NOT NULL,
+  `MAX_POOL_SIZE` INT(11) NOT NULL,
+  `IDLE_CONNECTION_TEST_PERIOD` INT(11) NOT NULL)
+ENGINE = InnoDB
+DEFAULT CHARACTER SET = utf8;
-- 
cgit 1.2.3-korg

