From ba6de666a6bc7860cb272bc9f4357e8c0f188e85 Mon Sep 17 00:00:00 2001
From: "Sonsino, Ofir (os0695)" <os0695@intl.att.com>
Date: Sun, 22 Apr 2018 17:51:39 +0300
Subject: Scale out use case

Change-Id: If0d42935185d3e4393a2607916c3046b4ebe41c6
Issue-ID: VID-188
Signed-off-by: Sonsino, Ofir (os0695) <os0695@intl.att.com>
---
 epsdk-app-onap/src/main/resources/vid-data.sql | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'epsdk-app-onap/src/main/resources/vid-data.sql')

diff --git a/epsdk-app-onap/src/main/resources/vid-data.sql b/epsdk-app-onap/src/main/resources/vid-data.sql
index b570c6630..6d4d67073 100755
--- a/epsdk-app-onap/src/main/resources/vid-data.sql
+++ b/epsdk-app-onap/src/main/resources/vid-data.sql
@@ -50,9 +50,11 @@ INSERT IGNORE INTO `fn_app` VALUES (1,'Default',null,'Some Default Description',
 --
 -- Dumping data for table `vid_workflow`
 --
-INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (1, 'Update') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='Update';
-INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (2, 'Replace') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='Replace';
+--update & replace workflows are disabled in ONAP
+--INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (1, 'Update') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='Update';
+--INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (2, 'Replace') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='Replace';
 INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (3, 'VNF In Place Software Update') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='VNF In Place Software Update';
+INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (4, 'VNF Scale Out') ON DUPLICATE KEY UPDATE WORKFLOW_APP_NAME='VNF Scale Out';
 
 
 --
-- 
cgit 1.2.3-korg

