From eda0409e699d09b44676e82217391f2724edb6a8 Mon Sep 17 00:00:00 2001
From: EricMoore <eric.e.moore@est.tech>
Date: Sun, 1 Mar 2020 19:14:22 +0200
Subject: Change Management: Support PNF software upgrade

Issue-ID: VID-505

Change-Id: I128b22092b78cf05a904648c276807a7ebb21aca
Signed-off-by: Ittay Stern <ittay.stern@att.com>
Signed-off-by: EricMoore <eric.e.moore@est.tech>
---
 epsdk-app-onap/src/main/resources/db.changelog-01.sql | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'epsdk-app-onap/src/main/resources/db.changelog-01.sql')

diff --git a/epsdk-app-onap/src/main/resources/db.changelog-01.sql b/epsdk-app-onap/src/main/resources/db.changelog-01.sql
index 9a24692a9..bc3b383f4 100644
--- a/epsdk-app-onap/src/main/resources/db.changelog-01.sql
+++ b/epsdk-app-onap/src/main/resources/db.changelog-01.sql
@@ -323,3 +323,6 @@ UPDATE `fn_app` SET `APP_IMAGE_URL`=null,`APP_URL`=null,`APP_ALTERNATE_URL`=null
 --changeset vid:service_info_request_summary
 ALTER TABLE `vid_openecomp_epsdk`.`vid_service_info`
   ADD COLUMN `REQUEST_SUMMARY` VARCHAR(400) NULL DEFAULT NULL COLLATE 'utf8_bin';
+
+--changeset vid:add_workflow_pnf_software_upgrade
+INSERT INTO `vid_workflow` (`WORKFLOW_DB_ID`, `WORKFLOW_APP_NAME`) VALUES (7, 'PNF Software Upgrade');
-- 
cgit 1.2.3-korg

