From b08cc1d19a88e809aca5a3f0a3320dfbf1fcaab1 Mon Sep 17 00:00:00 2001
From: shentao <shentao@chinamobile.com>
Date: Mon, 13 Nov 2017 15:31:11 +0800
Subject: Fix dmaap calling bug

Change-Id: I57c63ff3cc237d56ed38fb27d4a8a89f10f6f075
Issue-Id: USECASEUI-54
Signed-off-by: shentao <shentao@chinamobile.com>
---
 resources/dbscripts/mysql/usecase-ui-createobj.sql | 111 ---------------------
 1 file changed, 111 deletions(-)
 delete mode 100644 resources/dbscripts/mysql/usecase-ui-createobj.sql

(limited to 'resources/dbscripts/mysql/usecase-ui-createobj.sql')

diff --git a/resources/dbscripts/mysql/usecase-ui-createobj.sql b/resources/dbscripts/mysql/usecase-ui-createobj.sql
deleted file mode 100644
index 7f839578..00000000
--- a/resources/dbscripts/mysql/usecase-ui-createobj.sql
+++ /dev/null
@@ -1,111 +0,0 @@
---
--- Copyright (C) 2017 CMCC, Inc. and others. All rights reserved.
---
--- Licensed under the Apache License, Version 2.0 (the "License");
--- you may not use this file except in compliance with the License.
--- You may obtain a copy of the License at
---
---     http://www.apache.org/licenses/LICENSE-2.0
---
--- Unless required by applicable law or agreed to in writing, software
--- distributed under the License is distributed on an "AS IS" BASIS,
--- WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
--- See the License for the specific language governing permissions and
--- limitations under the License.
---
-
-use usercaseui;
-
-SET FOREIGN_KEY_CHECKS=0;
--- ----------------------------
--- Table structure for alarms_additionalinformation
--- ----------------------------
-DROP TABLE IF EXISTS `alarms_additionalinformation`;
-CREATE TABLE `alarms_additionalinformation` (
-  `name` varchar(50) NOT NULL,
-  `value` varchar(500) NOT NULL,
-  `eventId` varchar(30) NOT NULL,
-  `createTime` datetime NOT NULL,
-  `updateTime` datetime NOT NULL,
-  `id` int(10) NOT NULL,
-  PRIMARY KEY (`id`)
-) ENGINE=InnoDB DEFAULT CHARSET=utf8;
-
--- ----------------------------
--- Table structure for alarms_commoneventheader
--- ----------------------------
-DROP TABLE IF EXISTS `alarms_commoneventheader`;
-CREATE TABLE `alarms_commoneventheader` (
-  `version` varchar(10) NOT NULL,
-  `eventName` varchar(50) NOT NULL,
-  `domain` varchar(30) NOT NULL,
-  `eventId` varchar(30) NOT NULL,
-  `eventType` varchar(30) NOT NULL,
-  `nfcNamingCode` varchar(30) DEFAULT NULL,
-  `nfNamingCode` varchar(30) DEFAULT NULL,
-  `sourceId` varchar(50) NOT NULL,
-  `sourceName` varchar(50) NOT NULL,
-  `reportingEntityId` varchar(30) NOT NULL,
-  `reportingEntityName` varchar(30) NOT NULL,
-  `priority` varchar(20) NOT NULL,
-  `startEpochMicrosec` varchar(20) NOT NULL,
-  `lastEpochMicroSec` varchar(20) NOT NULL,
-  `sequence` varchar(10) NOT NULL,
-  `faultFieldsVersion` varchar(10) NOT NULL,
-  `eventServrity` varchar(30) NOT NULL,
-  `eventSourceType` varchar(30) NOT NULL,
-  `eventCategory` varchar(30) NOT NULL,
-  `alarmCondition` varchar(400) NOT NULL,
-  `specificProblem` varchar(400) NOT NULL,
-  `vfStatus` varchar(10) NOT NULL,
-  `alarmInterfaceA` varchar(40) NOT NULL,
-  `status` varchar(11) NOT NULL,
-  `createTime` datetime NOT NULL,
-  `updateTime` datetime NOT NULL,
-  PRIMARY KEY (`eventName`)
-) ENGINE=InnoDB DEFAULT CHARSET=utf8;
-
--- ----------------------------
--- Table structure for performance_additionalinformation
--- ----------------------------
-DROP TABLE IF EXISTS `performance_additionalinformation`;
-CREATE TABLE `performance_additionalinformation` (
-  `name` varchar(50) NOT NULL,
-  `value` varchar(500) NOT NULL,
-  `eventId` varchar(30) NOT NULL,
-  `createTime` datetime NOT NULL,
-  `updateTime` datetime NOT NULL,
-  `id` int(10) NOT NULL,
-  PRIMARY KEY (`id`)
-) ENGINE=InnoDB DEFAULT CHARSET=utf8;
-
--- ----------------------------
--- Table structure for performance_commoneventheader
--- ----------------------------
-DROP TABLE IF EXISTS `performance_commoneventheader`;
-CREATE TABLE `performance_commoneventheader` (
-  `version` varchar(10) NOT NULL,
-  `eventName` varchar(50) NOT NULL,
-  `domain` varchar(30) NOT NULL,
-  `eventId` varchar(30) NOT NULL,
-  `eventType` varchar(30) NOT NULL,
-  `nfcNamingCode` varchar(30) DEFAULT NULL,
-  `nfNamingCode` varchar(30) DEFAULT NULL,
-  `sourceId` varchar(50) NOT NULL,
-  `sourceName` varchar(50) NOT NULL,
-  `reportingEntityId` varchar(30) NOT NULL,
-  `reportingEntityName` varchar(30) NOT NULL,
-  `priority` varchar(20) NOT NULL,
-  `startEpochMicrosec` varchar(20) NOT NULL,
-  `lastEpochMicroSec` varchar(20) NOT NULL,
-  `sequence` varchar(10) NOT NULL,
-  `measurementsForVfScalingVersion` varchar(10) NOT NULL,
-  `measurementInterval` varchar(10) NOT NULL,
-  `createTime` datetime NOT NULL,
-  `updateTime` datetime NOT NULL,
-  PRIMARY KEY (`eventName`)
-) ENGINE=InnoDB DEFAULT CHARSET=utf8;
-
--- ----------------------------
--- Init Records 
--- ----------------------------
\ No newline at end of file
-- 
cgit 

