From db073432c2de9c8d248a0ff63d65b63a8fb920ca Mon Sep 17 00:00:00 2001
From: "Chan, Mercy" <merce.chan@att.com>
Date: Mon, 9 Sep 2019 16:41:56 -0400
Subject: updated all sql files including in tests to use

updated all sql files including in tests to use the correct column
name. Updated hibernate mapping to use the correct column name as well.

Issue-ID: SO-2297
Signed-off-by: Benjamin, Max (mb388a) <mb388a@att.com>
Change-Id: I4a2d3e82a7b182ea1d67d297c0a0d3a35c856255
---
 mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql')

diff --git a/mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql b/mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql
index ee53e491a4..2129dc2ede 100644
--- a/mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql
+++ b/mso-api-handlers/mso-api-handler-infra/src/test/resources/schema.sql
@@ -1276,7 +1276,7 @@ CREATE TABLE `infra_active_requests` (
   `VF_MODULE_NAME` varchar(200) DEFAULT NULL,
   `VF_MODULE_MODEL_NAME` varchar(200) DEFAULT NULL,
   `AAI_SERVICE_ID` varchar(50) DEFAULT NULL,
-  `AIC_CLOUD_REGION` varchar(11) DEFAULT NULL,
+  `CLOUD_REGION` varchar(11) DEFAULT NULL,
   `CALLBACK_URL` varchar(200) DEFAULT NULL,
   `CORRELATOR` varchar(80) DEFAULT NULL,
   `NETWORK_ID` varchar(45) DEFAULT NULL,
@@ -1329,7 +1329,7 @@ CREATE TABLE `archived_infra_requests` (
   `VF_MODULE_NAME` varchar(200) DEFAULT NULL,
   `VF_MODULE_MODEL_NAME` varchar(200) DEFAULT NULL,
   `AAI_SERVICE_ID` varchar(50) DEFAULT NULL,
-  `AIC_CLOUD_REGION` varchar(11) DEFAULT NULL,
+  `CLOUD_REGION` varchar(11) DEFAULT NULL,
   `CALLBACK_URL` varchar(200) DEFAULT NULL,
   `CORRELATOR` varchar(80) DEFAULT NULL,
   `NETWORK_ID` varchar(45) DEFAULT NULL,
-- 
cgit 1.2.3-korg

