From b75b28b8e56f19203cb6cce8ffeeaa771b9b60d8 Mon Sep 17 00:00:00 2001
From: "Plummer, Brittany" <brittany.plummer@att.com>
Date: Wed, 26 Jun 2019 10:58:22 -0400
Subject: add rollback ext system error source

Added rollbackExtSystemErrorSource column and updated GET
orchestrationRequests response
Added missing columns from requestDb to schema.sql

Change-Id: I2380f08b9bb1c86922e8faea70454df722c0873a
Issue-ID: SO-2054
Signed-off-by: Benjamin, Max (mb388a) <mb388a@us.att.com>
---
 asdc-controller/src/test/resources/schema.sql | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'asdc-controller/src/test/resources/schema.sql')

diff --git a/asdc-controller/src/test/resources/schema.sql b/asdc-controller/src/test/resources/schema.sql
index 5e4af83e0e..652fc8f0de 100644
--- a/asdc-controller/src/test/resources/schema.sql
+++ b/asdc-controller/src/test/resources/schema.sql
@@ -1461,7 +1461,10 @@ CREATE TABLE `infra_active_requests` (
   `CONFIGURATION_NAME` varchar(200) DEFAULT NULL,
   `OPERATIONAL_ENV_ID` varchar(45) DEFAULT NULL,
   `OPERATIONAL_ENV_NAME` varchar(200) DEFAULT NULL,
-  `REQUEST_URL` varchar(500) DEFAULT NULL,  
+  `REQUEST_URL` varchar(500) DEFAULT NULL,
+  `ORIGINAL_REQUEST_ID` varchar(45) DEFAULT NULL,
+  `EXT_SYSTEM_ERROR_SOURCE` varchar(80) DEFAULT NULL,
+  `ROLLBACK_EXT_SYSTEM_ERROR_SOURCE` varchar(80) DEFAULT NULL,
   PRIMARY KEY (`REQUEST_ID`),
   UNIQUE KEY `UK_bhu6w8p7wvur4pin0gjw2d5ak` (`CLIENT_REQUEST_ID`)
 ) ENGINE=InnoDB DEFAULT CHARSET=latin1;
-- 
cgit 1.2.3-korg

