From 1414f938b6fb86e6a15f3dfb9080f90f5d78b292 Mon Sep 17 00:00:00 2001
From: "Benjamin, Max (mb388a)" <mb388a@us.att.com>
Date: Thu, 14 Mar 2019 21:06:49 -0400
Subject: Saved vnfOperationalEnvironmentId to be used later

Removed unnecessary lines in junit test class.
Saved vnfOperationalEnvironmentId to the model table to be used for AAI
status update call later.

Change-Id: I812d21d483d716bb5135c408369a160e4600efc2
Issue-ID: SO-1662
Signed-off-by: Benjamin, Max (mb388a) <mb388a@us.att.com>
---
 asdc-controller/src/test/resources/schema.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'asdc-controller/src/test/resources/schema.sql')

diff --git a/asdc-controller/src/test/resources/schema.sql b/asdc-controller/src/test/resources/schema.sql
index 43572c476d..5f78c85c98 100644
--- a/asdc-controller/src/test/resources/schema.sql
+++ b/asdc-controller/src/test/resources/schema.sql
@@ -1026,6 +1026,7 @@ CREATE TABLE `activate_operational_env_service_model_distribution_status` (
   `WORKLOAD_CONTEXT` varchar(80) NOT NULL,
   `CREATE_TIME` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
   `MODIFY_TIME` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP,
+  `VNF_OPERATIONAL_ENV_ID` varchar(45) NOT NULL,  
   PRIMARY KEY (`OPERATIONAL_ENV_ID`,`SERVICE_MODEL_VERSION_ID`,`REQUEST_ID`)
 ) ENGINE=InnoDB DEFAULT CHARSET=latin1;
 
-- 
cgit 1.2.3-korg

