From 2fcd0d81688ca3dbde9c3853a0eca5aed9e4da7d Mon Sep 17 00:00:00 2001
From: Ramesh Parthasarathy <ramesh.parthasarathy@att.com>
Date: Thu, 16 May 2019 21:15:29 -0700
Subject: Addressed vCPE-Infra processing issue ASDC Controller

code was modified to address vCPE-infra notification received from SDC.
Also added unit tests to ensure that the code works as expected.

Change-Id: I217e2dfed9548bfb0e9b93c96aaf75afc1d4171c
Issue-ID: SO-1861
Signed-off-by: Ramesh Parthasarathy(rp6768)<ramesh.parthasarathy@att.com>
---
 asdc-controller/src/test/resources/data.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'asdc-controller/src/test/resources/data.sql')

diff --git a/asdc-controller/src/test/resources/data.sql b/asdc-controller/src/test/resources/data.sql
index c9179fe65f..bc97b1e54a 100644
--- a/asdc-controller/src/test/resources/data.sql
+++ b/asdc-controller/src/test/resources/data.sql
@@ -21,6 +21,8 @@ INSERT INTO temp_network_heat_template_lookup(NETWORK_RESOURCE_MODEL_NAME, HEAT_
 ('TENANT_OAM_NETWORK', 'ff874603-4222-11e7-9252-005056850d2e', '3.0', NULL);
 INSERT INTO temp_network_heat_template_lookup(NETWORK_RESOURCE_MODEL_NAME, HEAT_TEMPLATE_ARTIFACT_UUID, AIC_VERSION_MIN, AIC_VERSION_MAX) VALUES
 ('SRIOV_PROVIDER_NETWORK', 'ff874603-4222-11e7-9252-005056850d2e', '3.0', NULL);
+INSERT INTO temp_network_heat_template_lookup(NETWORK_RESOURCE_MODEL_NAME, HEAT_TEMPLATE_ARTIFACT_UUID, AIC_VERSION_MIN, AIC_VERSION_MAX) VALUES
+('Generic NeutronNet', 'ff874603-4222-11e7-9252-005056850d2e', '3.0', NULL);
 
 insert into vnf_resource(orchestration_mode, description, creation_timestamp, model_uuid, aic_version_min, aic_version_max, model_invariant_uuid, model_version, model_name, tosca_node_type, heat_template_artifact_uuid) values
 ('HEAT', '1607 vSAMP10a - inherent network', '2017-04-14 21:46:28', 'ff2ae348-214a-11e7-93ae-92361f002671', '', '', '2fff5b20-214b-11e7-93ae-92361f002671', '1.0', 'vSAMP10a', 'VF', null);
-- 
cgit 1.2.3-korg

