From c22110ebcc4df14891b0f3af3739a5a3fb4d51ef Mon Sep 17 00:00:00 2001
From: "Smokowski, Steven" <steve.smokowski@att.com>
Date: Fri, 10 May 2019 10:01:06 -0400
Subject: Update Rainy day handling to be more robust

Clean up unused tests and code, update UT
Fix issue with junits and conflicts on id field
Update Rainy day handling to be more robust

Change-Id: I2ce9a1288457017613dece19357e44b8566867c5
Issue-ID: SO-1866
Signed-off-by: Benjamin, Max (mb388a) <mb388a@us.att.com>
---
 .../src/test/resources/db/migration/afterMigrate.sql                 | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'adapters/mso-catalog-db-adapter/src/test/resources/db/migration/afterMigrate.sql')

diff --git a/adapters/mso-catalog-db-adapter/src/test/resources/db/migration/afterMigrate.sql b/adapters/mso-catalog-db-adapter/src/test/resources/db/migration/afterMigrate.sql
index 0229dd0d85..0e981f2b70 100644
--- a/adapters/mso-catalog-db-adapter/src/test/resources/db/migration/afterMigrate.sql
+++ b/adapters/mso-catalog-db-adapter/src/test/resources/db/migration/afterMigrate.sql
@@ -183,7 +183,10 @@ VALUES      ( '9bcce658-9b37-11e8-98d0-529269fb1459',
               'toscaNodeType',
               'testVnfcCustomizationDescription',
               '2018-07-17 14:05:08');
-              
+
+INSERT INTO `rainy_day_handler_macro` (`FLOW_NAME`,`SERVICE_TYPE`,`VNF_TYPE`,`ERROR_CODE`,`WORK_STEP`,`POLICY`,`SECONDARY_POLICY`,`REG_EX_ERROR_MESSAGE`) 
+VALUES ('AssignServiceInstanceBB','*','*','*','*','Rollback','Rollback','The Flavor ID.*could not be found.');
+
 INSERT INTO `cvnfc_customization`
             (`id`,
              `model_customization_uuid`,
-- 
cgit 1.2.3-korg

