From 7f4adc268168464dcbc51f8730d570198979b16e Mon Sep 17 00:00:00 2001
From: "Smokowski, Steve (ss835w)" <ss835w@us.att.com>
Date: Wed, 21 Nov 2018 09:09:09 -0500
Subject: Fix Default Record

Issue-ID: SO-1184

Change-Id: I2708484dce63be8bb043231444aec6eb6438fdae
Signed-off-by: Smokowski, Steve (ss835w) <ss835w@us.att.com>
---
 .../V4.16__Add_Default_NeutronNetwork.sql          | 23 +++++++++++++++++++++-
 1 file changed, 22 insertions(+), 1 deletion(-)

(limited to 'adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql')

diff --git a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
index dd821cab78..b937400f56 100644
--- a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
+++ b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
@@ -1,7 +1,28 @@
 USE catalogdb;
 
 INSERT INTO `heat_template` (`ARTIFACT_UUID`,`NAME`,`VERSION`,`BODY`,`TIMEOUT_MINUTES`,`DESCRIPTION`,`CREATION_TIMESTAMP`,`ARTIFACT_CHECKSUM`) VALUES
-('efee1d84-b8ec-11e7-abc4-cec278b6b50a','Generic NeutronNet','1','heat_template_version: 2013-05-23\n\ndescription:\n HOT template that creates a Generic Neutron Network\n\nparameters:\n network_name:\n type: string\n description: Name of direct network (e.g. core, dmz)\n default: ECOMPNetwork\n network_subnet_name:\n type: string\n description: Name of subnet network (e.g. core, dmz)\n default: ECOMPNetwork\n network_subnet_cidr:\n type: string\n description: CIDR of subnet network (e.g. core, dmz)\n default: 10.0.0.0/16\n\noutputs:\n network_id:\n description: Openstack network identifier\n value: { get_resource: network }\n network_fqdn:\n description: Openstack network identifier\n value: {list_join: [\':\', { get_attr: [network, fq_name] } ] }\n\nresources:\n network:\n type: OS::Neutron::Net\n properties:\n name: {get_param: network_name }\n\n subnet:\n type: OS::Neutron::Subnet\n properties:\n name: { get_param: network_subnet_name }\n network_id: { get_resource: network }\n cidr: { get_param: network_subnet_cidr }\n enable_dhcp: false\n',10,'Generic Neutron Template','2017-10-26 14:44:00', 'MANUAL RECORD');
+('efee1d84-b8ec-11e7-abc4-cec278b6b50a','Generic NeutronNet','1','
+heat_template_version: 2013-05-23
+description: A simple Neutron network
+parameters:
+ network_name:
+   type: string
+   description: Name of the Neutron Network
+   default: ONAP-NW1
+ shared:
+   type: boolean
+   description: Shared amongst tenants
+   default: False
+outputs:
+  network_id:
+    description: Openstack network identifier
+    value: { get_resource: network }
+resources:
+   network:
+     type: OS::Neutron::Net
+     properties:
+       name: { get_param: network_name }
+       shared: { get_param: shared }',10,'Generic Neutron Template','2017-10-26 14:44:00', 'MANUAL RECORD');
 
 
 
-- 
cgit 1.2.3-korg

