From 54b09cb4c75825a2afcfd7020c8c8ab763b64742 Mon Sep 17 00:00:00 2001
From: "Smokowski, Steve (ss835w)" <ss835w@us.att.com>
Date: Fri, 30 Nov 2018 09:51:52 -0500
Subject: Fix Cloud Version

Issue-ID: SO-1184

Change-Id: I6dcffafa489bb96100d5f67b09cef50a56dddf14
Signed-off-by: Smokowski, Steve (ss835w) <ss835w@us.att.com>
---
 .../main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql   | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql')

diff --git a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
index dd821cab78..3ad4b314eb 100644
--- a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
+++ b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/V4.16__Add_Default_NeutronNetwork.sql
@@ -6,5 +6,5 @@ INSERT INTO `heat_template` (`ARTIFACT_UUID`,`NAME`,`VERSION`,`BODY`,`TIMEOUT_MI
 
 
 INSERT INTO `temp_network_heat_template_lookup` (`NETWORK_RESOURCE_MODEL_NAME`, `HEAT_TEMPLATE_ARTIFACT_UUID`,`AIC_VERSION_MIN` , `AIC_VERSION_MAX` ) 
-VALUES ('Generic NeutronNet','efee1d84-b8ec-11e7-abc4-cec278b6b50a','2.0','NULL');
+VALUES ('Generic NeutronNet','efee1d84-b8ec-11e7-abc4-cec278b6b50a','2.0','3.0');
 
-- 
cgit 1.2.3-korg

