From e00d3ee9b090f3ceb87ac187e3e1c700d8a74fa7 Mon Sep 17 00:00:00 2001
From: sanket12345 <SX00562924@techmahindra.com>
Date: Tue, 30 Aug 2022 21:33:06 +0530
Subject: Code & Workflow  Enhancements for CNF - Upgrade

- Adding New Building Block : VfModuleUpgradeBB, which delgates Workflow to next BB by just changing AAI Orch_status, else WF fails during Orchestration flow validation DB lookup.
- Adding changes to BB Inputs to take new version VNF & VFM model details and pass to BBs, as done for Service-Macro-Upgrade.
- Adding new operations in CDS to skip execution,when SDC Model has skipCDS=True.
- Calling CNF Adapter with existing heatStackID & passing it for CNF-Upgrade with new customization details.

Issue-ID: SO-3857
Change-Id: I69f71f825b812d423f82f1a902dcb8567d8a6adb
Signed-off-by: sanket12345 <SX00562924@techmahindra.com>
---
 .../src/main/resources/db/migration/R__MacroData.sql | 20 +++++++++++---------
 1 file changed, 11 insertions(+), 9 deletions(-)

(limited to 'adapters/mso-catalog-db-adapter/src/main/resources/db/migration/R__MacroData.sql')

diff --git a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/R__MacroData.sql b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/R__MacroData.sql
index c1a67a5990..7b15b0ca47 100644
--- a/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/R__MacroData.sql
+++ b/adapters/mso-catalog-db-adapter/src/main/resources/db/migration/R__MacroData.sql
@@ -264,14 +264,15 @@ INSERT INTO orchestration_flow_reference(COMPOSITE_ACTION, SEQ_NO, FLOW_NAME, SC
 ('CNF-Macro-Upgrade', '2', 'AAISetVnfInMaintBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
 ('CNF-Macro-Upgrade', '3', 'DeactivateVfModuleBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
 ('CNF-Macro-Upgrade', '4', 'DeactivateVnfBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '5', 'ChangeModelVfModuleBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '6', 'ControllerExecutionBB', 'vnf', 'config-upgrade-assign', 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '7', 'UpgradeVfModuleBB', NULL , NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '8', 'ControllerExecutionBB', 'vnf', 'config-upgrade-deploy', 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '9', 'ActivateVfModuleBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '10', 'ChangeModelVnfBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '11', 'ActivateVnfBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
-('CNF-Macro-Upgrade', '12', 'AAIUnsetVnfInMaintBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT'));
+('CNF-Macro-Upgrade', '5', 'VfModuleUpgradeStatusBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '6', 'ChangeModelVfModuleBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '7', 'ControllerExecutionBB', 'vnf', 'config-upgrade-assign', 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '8', 'UpgradeVfModuleBB', NULL , NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '9', 'ControllerExecutionBB', 'vnf', 'config-upgrade-deploy', 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '10', 'ActivateVfModuleBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '11', 'ChangeModelVnfBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '12', 'ActivateVnfBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT')),
+('CNF-Macro-Upgrade', '13', 'AAIUnsetVnfInMaintBB', NULL, NULL, 1.0,(SELECT id from northbound_request_ref_lookup WHERE MACRO_ACTION = 'CNF-Macro-Upgrade' and CLOUD_OWNER = 'DEFAULT'));
 
 INSERT INTO rainy_day_handler_macro (FLOW_NAME, SERVICE_TYPE, VNF_TYPE, ERROR_CODE, WORK_STEP, POLICY, SECONDARY_POLICY, REG_EX_ERROR_MESSAGE, SERVICE_ROLE)
 VALUES
@@ -338,7 +339,8 @@ VALUES
 ('VNFUnsetInMaintFlagActivity','*','*','*','*','Manual','Abort','*', '*'),
 ('VNFUnsetClosedLoopDisabledActivity','*','*','*','*','Manual','Abort','*', '*'),
 ('DeleteChildServiceBB', '*', '*', '*', '*', 'Rollback', 'Abort', '*', '*'),
-('CreateChildServiceBB', '*', '*', '*', '*', 'Rollback', 'Abort', '*', '*');
+('CreateChildServiceBB', '*', '*', '*', '*', 'Rollback', 'Abort', '*', '*'),
+('UpgradeVfModuleBB', '*', '*', '*', '*', 'Rollback', 'Abort', '*', '*');
 
 INSERT INTO building_block_detail (building_block_name, resource_type, target_action)
 VALUES
-- 
cgit 1.2.3-korg

