From 8e9c0653dd6c6862123c9609ae34e1206d86456e Mon Sep 17 00:00:00 2001
From: talig <talig@amdocs.com>
Date: Wed, 20 Dec 2017 14:30:43 +0200
Subject: Add collaboration feature

Issue-ID: SDC-767
Change-Id: I14fb4c1f54086ed03a56a7ff7fab9ecd40381795
Signed-off-by: talig <talig@amdocs.com>
---
 .../network/nicEditorComponents/Acceptable.jsx     | 94 +++++++++++-----------
 1 file changed, 47 insertions(+), 47 deletions(-)

(limited to 'openecomp-ui/src/sdc-app/onboarding/softwareProduct/components/network/nicEditorComponents/Acceptable.jsx')

diff --git a/openecomp-ui/src/sdc-app/onboarding/softwareProduct/components/network/nicEditorComponents/Acceptable.jsx b/openecomp-ui/src/sdc-app/onboarding/softwareProduct/components/network/nicEditorComponents/Acceptable.jsx
index 524b95c3ad..0fc7404c56 100644
--- a/openecomp-ui/src/sdc-app/onboarding/softwareProduct/components/network/nicEditorComponents/Acceptable.jsx
+++ b/openecomp-ui/src/sdc-app/onboarding/softwareProduct/components/network/nicEditorComponents/Acceptable.jsx
@@ -21,53 +21,53 @@ import GridItem from 'nfvo-components/grid/GridItem.jsx';
 
 const Acceptable = ({qgenericFieldInfo, dataMap, onQDataChanged}) => {
 	return(
-		<GridSection>
-				<GridItem colSpan={3}>
-					<div className='part-title-small packets'>{i18n('Acceptable Jitter')}</div>
-				</GridItem>
-				<GridItem>
-					<div className='part-title-small bytes'>{i18n('Allow Packet Loss')}</div>
-				</GridItem>
-				<GridItem>
-					<Input
-						label={i18n('Mean')}
-						type='number'
-						data-test-id='acceptableJitter-mean'
-						isValid={qgenericFieldInfo['sizing/acceptableJitter/mean'].isValid}
-						errorText={qgenericFieldInfo['sizing/acceptableJitter/mean'].errorText}
-						value={dataMap['sizing/acceptableJitter/mean']}
-						onChange={val => onQDataChanged({'sizing/acceptableJitter/mean' : val})} />
-				</GridItem>
-				<GridItem>
-					<Input
-						label={i18n('Max')}
-						type='number'
-						data-test-id='acceptableJitter-max'
-						isValid={qgenericFieldInfo['sizing/acceptableJitter/max'].isValid}
-						errorText={qgenericFieldInfo['sizing/acceptableJitter/max'].errorText}
-						value={dataMap['sizing/acceptableJitter/max']}
-						onChange={val => onQDataChanged({'sizing/acceptableJitter/max' : val})} />
-				</GridItem>
-				<GridItem>
-					<Input
-						label={i18n('Var')}
-						type='number'
-						data-test-id='acceptableJitter-variable'
-						isValid={qgenericFieldInfo['sizing/acceptableJitter/variable'].isValid}
-						errorText={qgenericFieldInfo['sizing/acceptableJitter/variable'].errorText}
-						value={dataMap['sizing/acceptableJitter/variable']}
-						onChange={val => onQDataChanged({'sizing/acceptableJitter/variable' : val})} />
-				</GridItem>
-				<GridItem>
-					<Input
-						label={i18n('In Percent')}
-						type='number'
-						data-test-id='acceptableJitter-acceptablePacketLoss'
-						isValid={qgenericFieldInfo['sizing/acceptablePacketLoss'].isValid}
-						errorText={qgenericFieldInfo['sizing/acceptablePacketLoss'].errorText}
-						value={dataMap['sizing/acceptablePacketLoss']}
-						onChange={val => onQDataChanged({'sizing/acceptablePacketLoss' : val})} />
-				</GridItem>
+		<GridSection hasLastColSet>
+			<GridItem colSpan={3}>
+				<div className='part-title-small packets'>{i18n('Acceptable Jitter')}</div>
+			</GridItem>
+			<GridItem lastColInRow>
+				<div className='part-title-small bytes'>{i18n('Allow Packet Loss')}</div>
+			</GridItem>
+			<GridItem>
+				<Input
+					label={i18n('Mean')}
+					type='number'
+					data-test-id='acceptableJitter-mean'
+					isValid={qgenericFieldInfo['sizing/acceptableJitter/mean'].isValid}
+					errorText={qgenericFieldInfo['sizing/acceptableJitter/mean'].errorText}
+					value={dataMap['sizing/acceptableJitter/mean']}
+					onChange={val => onQDataChanged({'sizing/acceptableJitter/mean' : val})} />
+			</GridItem>
+			<GridItem>
+				<Input
+					label={i18n('Max')}
+					type='number'
+					data-test-id='acceptableJitter-max'
+					isValid={qgenericFieldInfo['sizing/acceptableJitter/max'].isValid}
+					errorText={qgenericFieldInfo['sizing/acceptableJitter/max'].errorText}
+					value={dataMap['sizing/acceptableJitter/max']}
+					onChange={val => onQDataChanged({'sizing/acceptableJitter/max' : val})} />
+			</GridItem>
+			<GridItem>
+				<Input
+					label={i18n('Var')}
+					type='number'
+					data-test-id='acceptableJitter-variable'
+					isValid={qgenericFieldInfo['sizing/acceptableJitter/variable'].isValid}
+					errorText={qgenericFieldInfo['sizing/acceptableJitter/variable'].errorText}
+					value={dataMap['sizing/acceptableJitter/variable']}
+					onChange={val => onQDataChanged({'sizing/acceptableJitter/variable' : val})} />
+			</GridItem>
+			<GridItem lastColInRow>
+				<Input
+					label={i18n('In Percent')}
+					type='number'
+					data-test-id='acceptableJitter-acceptablePacketLoss'
+					isValid={qgenericFieldInfo['sizing/acceptablePacketLoss'].isValid}
+					errorText={qgenericFieldInfo['sizing/acceptablePacketLoss'].errorText}
+					value={dataMap['sizing/acceptablePacketLoss']}
+					onChange={val => onQDataChanged({'sizing/acceptablePacketLoss' : val})} />
+			</GridItem>
 		</GridSection>
 	);
 };
-- 
cgit 1.2.3-korg

