From b3d4898d9e8452ea0b8d848c048e712d43b8d9a3 Mon Sep 17 00:00:00 2001
From: Michael Lando <ml636r@att.com>
Date: Sun, 11 Jun 2017 14:22:02 +0300
Subject: [SDC-29] rebase continue work to align source

Change-Id: I218f1c5ee23fb2c8314f1c70921d3ad8682c10f4
Signed-off-by: Michael Lando <ml636r@att.com>
---
 .../softwareProduct/attachments/SoftwareProductAttachmentsView.jsx      | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'openecomp-ui/src/sdc-app/onboarding/softwareProduct/attachments/SoftwareProductAttachmentsView.jsx')

diff --git a/openecomp-ui/src/sdc-app/onboarding/softwareProduct/attachments/SoftwareProductAttachmentsView.jsx b/openecomp-ui/src/sdc-app/onboarding/softwareProduct/attachments/SoftwareProductAttachmentsView.jsx
index 66fb2f8356..ef4aecf568 100644
--- a/openecomp-ui/src/sdc-app/onboarding/softwareProduct/attachments/SoftwareProductAttachmentsView.jsx
+++ b/openecomp-ui/src/sdc-app/onboarding/softwareProduct/attachments/SoftwareProductAttachmentsView.jsx
@@ -50,7 +50,7 @@ class HeatScreenView extends Component {
 							iconClassName={this.props.goToOverview ? '' : 'disabled'}
 							className={`go-to-overview-icon ${this.props.goToOverview ? '' : 'disabled'}`}
 							labelClassName='go-to-overview-label'
-							onClick={this.props.goToOverview ? onGoToOverview : undefined}
+							onClick={this.props.goToOverview ? () => onGoToOverview({version}) : undefined}
 							image='go-to-overview'
 							label={i18n('Go to Overview')}
 							data-test-id='go-to-overview'/>}
-- 
cgit 1.2.3-korg

