From 61070c9c6b665fdea79b3ccdfeafc3a6b50d262e Mon Sep 17 00:00:00 2001
From: Avi Ziv <AVIZI@amdocs.com>
Date: Wed, 26 Jul 2017 17:37:57 +0300
Subject: [SDC] Full OnBoard health-check and NFoD support

Change-Id: I606f8a52c7e6d2bd5558f824957d890e552c5423
Signed-off-by: Avi Ziv <avi.ziv@amdocs.com>
---
 openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx')

diff --git a/openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx b/openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx
index 3b3e2fcf40..5939499ec5 100644
--- a/openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx
+++ b/openecomp-ui/src/sdc-app/onboarding/onboard/CatalogItemDetails.jsx
@@ -49,7 +49,7 @@ const CatalogTileVendorName = ({vendorName, catalogItemTypeClass}) => {
 };
 
 const CatalogTileItemName = ({name}) => (
-	<OverlayTrigger placement='top' overlay={tooltip(name && name.toUpperCase())}>
+	<OverlayTrigger placement='top' overlay={tooltip(name)}>
 		<div className='catalog-tile-item-name'>{name}</div>
 	</OverlayTrigger>
 );
-- 
cgit 1.2.3-korg

