From 7fdf733a64670fceefc3ded35cfa581e1c458179 Mon Sep 17 00:00:00 2001
From: Einav Weiss Keidar <einavw@amdocs.com>
Date: Tue, 20 Mar 2018 14:45:40 +0200
Subject: Adding Prettier and fixing up eslint version

Issue-ID: SDC-1094
Change-Id: Ie83ad95a03899345dd90235daf0323cbe3bc6afd
Signed-off-by: Einav Weiss Keidar <einavw@amdocs.com>
---
 openecomp-ui/src/sdc-app/heatValidation.app.jsx | 8 ++++++--
 1 file changed, 6 insertions(+), 2 deletions(-)

(limited to 'openecomp-ui/src/sdc-app/heatValidation.app.jsx')

diff --git a/openecomp-ui/src/sdc-app/heatValidation.app.jsx b/openecomp-ui/src/sdc-app/heatValidation.app.jsx
index 5abe3091b3..bb9a4bbe9b 100644
--- a/openecomp-ui/src/sdc-app/heatValidation.app.jsx
+++ b/openecomp-ui/src/sdc-app/heatValidation.app.jsx
@@ -23,5 +23,9 @@ import ReactDOM from 'react-dom';
 import UploadScreen from './heatvalidation/UploadScreen.jsx';
 import Application from './Application.jsx';
 
-
-ReactDOM.render(<Application openSocket={false}><UploadScreen/></Application>, document.getElementById('heat-validation-app'));
+ReactDOM.render(
+    <Application openSocket={false}>
+        <UploadScreen />
+    </Application>,
+    document.getElementById('heat-validation-app')
+);
-- 
cgit 1.2.3-korg

