From a51eac038c8896b2413d0c57e223d49870fd1079 Mon Sep 17 00:00:00 2001
From: Arielk <Ariel.Kenan@amdocs.com>
Date: Sun, 7 Jul 2019 12:56:11 +0300
Subject: upgrade to ONAP-UI

Change-Id: Iddc6a62cc0b7981daa5ceb2422b967c95b031422
Issue-ID: SDC-2411
Signed-off-by: Arielk <Ariel.Kenan@amdocs.com>
---
 openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx')

diff --git a/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx b/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
index ca24964472..8e7c87d613 100644
--- a/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
+++ b/openecomp-ui/src/sdc-app/flows/SequenceDiagram.jsx
@@ -15,7 +15,7 @@
  */
 import React, { Component } from 'react';
 import PropTypes from 'prop-types';
-import Button from 'sdc-ui/lib/react/Button.js';
+import { Button } from 'onap-ui-react';
 import Sequencer from 'dox-sequence-diagram-ui';
 
 import i18n from 'nfvo-utils/i18n/i18n.js';
-- 
cgit 1.2.3-korg

