From a51eac038c8896b2413d0c57e223d49870fd1079 Mon Sep 17 00:00:00 2001
From: Arielk <Ariel.Kenan@amdocs.com>
Date: Sun, 7 Jul 2019 12:56:11 +0300
Subject: upgrade to ONAP-UI

Change-Id: Iddc6a62cc0b7981daa5ceb2422b967c95b031422
Issue-ID: SDC-2411
Signed-off-by: Arielk <Ariel.Kenan@amdocs.com>
---
 openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx')

diff --git a/openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx b/openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx
index 3e0bb32ca9..3dcba86def 100644
--- a/openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx
+++ b/openecomp-ui/src/nfvo-components/input/validation/InputWrapper.jsx
@@ -17,7 +17,7 @@ import React from 'react';
 import ReactDOM from 'react-dom';
 import classNames from 'classnames';
 import Checkbox from 'react-bootstrap/lib/Checkbox.js';
-import Radio from 'sdc-ui/lib/react/Radio.js';
+import { Radio } from 'onap-ui-react';
 import FormGroup from 'react-bootstrap/lib/FormGroup.js';
 import FormControl from 'react-bootstrap/lib/FormControl.js';
 
-- 
cgit 1.2.3-korg

