From 61070c9c6b665fdea79b3ccdfeafc3a6b50d262e Mon Sep 17 00:00:00 2001
From: Avi Ziv <AVIZI@amdocs.com>
Date: Wed, 26 Jul 2017 17:37:57 +0300
Subject: [SDC] Full OnBoard health-check and NFoD support

Change-Id: I606f8a52c7e6d2bd5558f824957d890e552c5423
Signed-off-by: Avi Ziv <avi.ziv@amdocs.com>
---
 openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx')

diff --git a/openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx b/openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx
index 6e54254eb0..9b11d27c2b 100644
--- a/openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx
+++ b/openecomp-ui/src/nfvo-components/input/validation/InputOptions.jsx
@@ -64,7 +64,8 @@ class InputOptions extends React.Component {
 		const dataTestId = this.props['data-test-id'] ? {'data-test-id': this.props['data-test-id']} : {};
 		let currentMultiSelectedEnum = [];
 		let currentSelectedEnum = '';
-		let {otherInputDisabled} = this.state;
+		let otherInputDisabled = (isMultiSelect && (multiSelectedEnum === undefined || multiSelectedEnum.length === 0 || multiSelectedEnum[0] !== other.OTHER))
+			|| (!isMultiSelect && (selectedEnum === undefined || selectedEnum !== other.OTHER));
 		if (isMultiSelect) {
 			currentMultiSelectedEnum = multiSelectedEnum;
 			if(!otherInputDisabled) {
-- 
cgit 1.2.3-korg

