From 644017cb3edd5b7a077a634ffd5daf2fee6bc088 Mon Sep 17 00:00:00 2001
From: az2497 <avi.ziv@amdocs.com>
Date: Thu, 10 Aug 2017 17:49:40 +0300
Subject: [SDC] OnBoard with enabled tests and features

Change-Id: I4c1bbf6e1c854cf97a3561c736f83da44b58b7c0
Signed-off-by: az2497 <avi.ziv@amdocs.com>

[SDC] OnBoard with enabled tests and features.

Change-Id: Icd52f039aee4dd393a1404d530bb9fdd0b20e604
Signed-off-by: az2497 <avi.ziv@amdocs.com>
---
 openecomp-ui/src/nfvo-components/input/ToggleInput.jsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'openecomp-ui/src/nfvo-components/input/ToggleInput.jsx')

diff --git a/openecomp-ui/src/nfvo-components/input/ToggleInput.jsx b/openecomp-ui/src/nfvo-components/input/ToggleInput.jsx
index 7bbafa3696..23af72a26a 100644
--- a/openecomp-ui/src/nfvo-components/input/ToggleInput.jsx
+++ b/openecomp-ui/src/nfvo-components/input/ToggleInput.jsx
@@ -41,6 +41,7 @@ class ToggleInput extends React.Component {
 	render() {
 		let {label, disabled} = this.props;
 		let checked = this.status() === 'on';
+		//TODO check onclick
 		return (
 			<div className='toggle-input-wrapper form-group' onClick={!disabled && this.click}>
 				<div className='toggle-input-label'>{label}</div>
-- 
cgit 1.2.3-korg

