From 7fdf733a64670fceefc3ded35cfa581e1c458179 Mon Sep 17 00:00:00 2001
From: Einav Weiss Keidar <einavw@amdocs.com>
Date: Tue, 20 Mar 2018 14:45:40 +0200
Subject: Adding Prettier and fixing up eslint version

Issue-ID: SDC-1094
Change-Id: Ie83ad95a03899345dd90235daf0323cbe3bc6afd
Signed-off-by: Einav Weiss Keidar <einavw@amdocs.com>
---
 dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx')

diff --git a/dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx b/dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx
index 4b0f7d2388..1c783cb890 100644
--- a/dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx
+++ b/dox-sequence-diagram-ui/src/main/webapp/lib/main.jsx
@@ -21,15 +21,15 @@ import '../res/ecomp/asdc/sequencer/sequencer-development.scss';
 import '../res/thirdparty/react-select/react-select.min.css';
 
 function renderApplication() {
-  const shell = document.createElement('div');
-  shell.setAttribute('style', 'height:100%;width:100%;margin:0;padding:0');
-  document.body.appendChild(shell);
-  const options = { demo: true };
-  render(<Sequencer options={options} />, shell);
+    const shell = document.createElement('div');
+    shell.setAttribute('style', 'height:100%;width:100%;margin:0;padding:0');
+    document.body.appendChild(shell);
+    const options = { demo: true };
+    render(<Sequencer options={options} />, shell);
 }
 
 if (window.addEventListener) {
-  window.addEventListener('DOMContentLoaded', renderApplication);
+    window.addEventListener('DOMContentLoaded', renderApplication);
 } else {
-  window.attachEvent('onload', renderApplication);
+    window.attachEvent('onload', renderApplication);
 }
-- 
cgit 1.2.3-korg

