-- ---------------------------------------------------------------------------------------------------------------
-- This script adds tables for the OPEN-SOURCE version 3.2.0 of the ECOMP SDK application database.
-- The DDL COMMON script must be executed first!
-- ---------------------------------------------------------------------------------------------------------------

SET FOREIGN_KEY_CHECKS=1; 

USE ecomp_sdk;

-- No additional tables required at this time

commit;
