-- ---------------------------------------------------------------------------------------------------------------
-- This script adds tables for the 1707 OPEN-SOURCE version of the ECOMP SDK application database.
-- The DDL 1707 COMMON script must be executed first!
-- ---------------------------------------------------------------------------------------------------------------

SET FOREIGN_KEY_CHECKS=1; 

USE ecomp_sdk;

-- No additional tables required at this time

commit;
