From 7246eabfd23d6cadc9f658f666df62b93f30ed70 Mon Sep 17 00:00:00 2001
From: st782s <statta@research.att.com>
Date: Tue, 20 Nov 2018 07:31:32 -0500
Subject: CADI Integration

Issue-ID: PORTAL-474

System to system authorization using CADI

Change-Id: I76487f8155a36fca8283669fe5e28ec7d5aec91d
Signed-off-by: st782s <statta@research.att.com>
---
 .../epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql      | 12 ++++++++++++
 1 file changed, 12 insertions(+)
 create mode 100644 ecomp-sdk/epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql

(limited to 'ecomp-sdk/epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql')

diff --git a/ecomp-sdk/epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql b/ecomp-sdk/epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql
new file mode 100644
index 00000000..c0d1c721
--- /dev/null
+++ b/ecomp-sdk/epsdk-app-os/db-scripts/EcompSdkDDLMySql_2_5_OS.sql
@@ -0,0 +1,12 @@
+-- ---------------------------------------------------------------------------------------------------------------
+-- This script adds tables for the OPEN-SOURCE version 2.1.0 of the ECOMP SDK application database.
+-- The DDL COMMON script must be executed first!
+-- ---------------------------------------------------------------------------------------------------------------
+
+SET FOREIGN_KEY_CHECKS=1; 
+
+USE ecomp_sdk;
+
+-- No additional tables required at this time
+
+commit;
\ No newline at end of file
-- 
cgit 1.2.3-korg

