From 1298fd26f37cd451cbf1adbea68b98151662e796 Mon Sep 17 00:00:00 2001
From: Hima Elisetty <hbindu@research.att.com>
Date: Fri, 12 Jan 2018 10:36:42 -0500
Subject: Introduce JUNIT Plumbing

Issue-ID: PORTAL-161, PORTAL-160, PORTAL-159

Includes Change in encryption and decryption algorithm

Change-Id: I5f379d6d9ac25536744152ac1d61223a52f1ce7f
Signed-off-by: Hima Elisetty <hbindu@research.att.com>
---
 .../db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql   | 10 ++++++++++
 1 file changed, 10 insertions(+)
 create mode 100644 ecomp-sdk/epsdk-app-common/db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql

(limited to 'ecomp-sdk/epsdk-app-common/db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql')

diff --git a/ecomp-sdk/epsdk-app-common/db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql b/ecomp-sdk/epsdk-app-common/db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql
new file mode 100644
index 00000000..14ef6f1e
--- /dev/null
+++ b/ecomp-sdk/epsdk-app-common/db-scripts/EcompSdkMySql_Rollback_2_1_to_1710_Common.sql
@@ -0,0 +1,10 @@
+use ecomp_sdk;
+
+DELETE FROM fn_restricted_url
+where RESTRICTED_URL in('admin', 'get_role', 'get_role_functions', 'role_list/*', 'role_function_list/*', 'addRole', 'addRoleFunction', 'removeRole',
+						'removeRoleFunction', 'profile/*', 'samplePage','workflows', 'workflows/list', 'workflows/addWorkflow', 'workflows/saveCronJob',
+						'workflows/editWorkflow', 'workflows/removeWorkflow', 'workflows/removeAllWorkflows','role/saveRole.htm','post_search/process', 'post_search/search', 'report/wizard/retrieve_def_tab_wise_data/*',
+						'report/wizard/retrieve_form_tab_wise_data/*', 'report/wizard/retrieve_sql_tab_wise_data/*', 'report/wizard/security/*', 'report/wizard/copy_report/*', 'report/wizard/save_def_tab_data/*', 'report/wizard/retrieve_data/true',
+						'report/security/*');
+
+commit;
\ No newline at end of file
-- 
cgit 1.2.3-korg

