-- ---------------------------------------------------------------------------------------------------------------
-- This script adds tables for the 1710 OPEN-SOURCE version of the ECOMP Portal database.
-- The DDL 1710 COMMON script must be executed first!
-- ---------------------------------------------------------------------------------------------------------------

SET FOREIGN_KEY_CHECKS=1; 

USE portal;

-- No additional tables required at this time

commit;
