From b714eeed757cd115ed45bdc90e438fb33d76823f Mon Sep 17 00:00:00 2001
From: Manoop Talasila <talasila@research.att.com>
Date: Fri, 4 May 2018 15:03:50 -0400
Subject: Replace 2017 with 2017-2018 in license text

Make CLI application as integrated app in portal

Issue-ID: PORTAL-176, PORTAL-152

Change-Id: I515dd6f8255fcf36b3a8753da7449de0a7564489
Signed-off-by: Manoop Talasila <talasila@research.att.com>
---
 deliveries/Apps_Users_OnBoarding_Script.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'deliveries/Apps_Users_OnBoarding_Script.sql')

diff --git a/deliveries/Apps_Users_OnBoarding_Script.sql b/deliveries/Apps_Users_OnBoarding_Script.sql
index 34dbe896..0232a1f4 100644
--- a/deliveries/Apps_Users_OnBoarding_Script.sql
+++ b/deliveries/Apps_Users_OnBoarding_Script.sql
@@ -12,7 +12,7 @@ INSERT INTO `fn_app` (`app_id`, `app_name`, `app_image_url`, `app_description`,
 (5, 'Policy', 'images/cache/portal1470452815_67021.png', NULL, NULL, 'http://policy.api.simpledemo.onap.org:8443/onap/policy', NULL, 'http://policy.api.simpledemo.onap.org:8443/onap/api/v2', '', '', NULL, 'okYTaDrhzibcbGVq5mjkVQ==', 'N', 'Y', NULL, 'Default', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
 (6, 'Virtual Infrastructure Deployment', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://vid.api.simpledemo.onap.org:8080/vid/welcome.htm', NULL, 'http://vid.api.simpledemo.onap.org:8080/vid/api/v2', '', '', NULL, 'okYTaDrhzibcbGVq5mjkVQ==', 'N', 'Y', NULL, 'Default', '2Re7Pvdkgw5aeAUD', 'S31PrbOzGgL4hg4owgtx47Da', 'ECOMP-PORTAL-OUTBOX-90', 1,'N',NULL),
 (7, 'A&AI UI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://aai.api.simpledemo.onap.org:9517/services/aai/webapp/index.html#/viewInspect', NULL, 'http://aai.api.simpledemo.onap.org:9517/api/v2', '', '', NULL, 't1oqm6wCXrGUXUSL8mS7pQ==', 'N', 'Y', NULL, 'aaiui', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
-(8, 'CLI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8080/', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 2,'N',NULL),
+(8, 'CLI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8080/', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 1,'N',NULL),
 (9, 'MSB', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://msb-discovery:8080/iui/microservices/default.html', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 2,'N',NULL);
 
 -- insert SDC users user id2-8
-- 
cgit 1.2.3-korg

