From 35d46475ddd9b4b3c357d9a5bdcdc0e7ebd30105 Mon Sep 17 00:00:00 2001
From: 00164331 <li.zi30@zte.com.cn>
Date: Fri, 16 Mar 2018 10:57:37 +0800
Subject: Integration MSB GUI to Portal project.

This submit to add MSB GUI to portal home page.

Change-Id: Ieb49cc4621352733df7f461fe3bad5e5b38fff0b
Issue-ID: MSB-179
Signed-off-by: LiZi <li.zi30@zte.com.cn>
---
 deliveries/Apps_Users_OnBoarding_Script.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'deliveries/Apps_Users_OnBoarding_Script.sql')

diff --git a/deliveries/Apps_Users_OnBoarding_Script.sql b/deliveries/Apps_Users_OnBoarding_Script.sql
index 14e9ff2d..38b2cd1a 100644
--- a/deliveries/Apps_Users_OnBoarding_Script.sql
+++ b/deliveries/Apps_Users_OnBoarding_Script.sql
@@ -13,6 +13,7 @@ INSERT INTO `fn_app` (`app_id`, `app_name`, `app_image_url`, `app_description`,
 (6, 'Virtual Infrastructure Deployment', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://vid.api.simpledemo.onap.org:8080/vid/welcome.htm', NULL, 'http://vid.api.simpledemo.onap.org:8080/vid/api/v2', '', '', NULL, 'okYTaDrhzibcbGVq5mjkVQ==', 'N', 'Y', NULL, 'Default', '2Re7Pvdkgw5aeAUD', 'S31PrbOzGgL4hg4owgtx47Da', 'ECOMP-PORTAL-OUTBOX-90', 1,'N',NULL),
 (7, 'A&AI UI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://aai.api.simpledemo.onap.org:9517/services/aai/webapp/index.html#/viewInspect', NULL, 'http://aai.api.simpledemo.onap.org:9517/api/v2', '', '', NULL, 't1oqm6wCXrGUXUSL8mS7pQ==', 'N', 'Y', NULL, 'aaiui', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
 (8, 'CLI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8080/', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 2,'N',NULL);
+(9, 'MSB', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://msb-discovery:8080/iui/microservices/default.html', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 2,'N',NULL);
 
 -- insert ASDC users user id2-8
 
-- 
cgit 1.2.3-korg

