From 43607e1ce6ba6280f47bd1f893b6cb51e37a02af Mon Sep 17 00:00:00 2001
From: "Welch, Lorraine (lb2391)" <lb2391@att.com>
Date: Wed, 17 Oct 2018 14:38:39 -0400
Subject: Changed AAI encrypted password, SDC entry

Issue-ID: PORTAL-434

Change-Id: I8db5a00dd3a8755b0bc310f7886b416d056867ea
Signed-off-by: Welch, Lorraine (lb2391) <lb2391@att.com>
---
 deliveries/Apps_Users_OnBoarding_Script.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'deliveries/Apps_Users_OnBoarding_Script.sql')

diff --git a/deliveries/Apps_Users_OnBoarding_Script.sql b/deliveries/Apps_Users_OnBoarding_Script.sql
index 08146ff2..376636b2 100644
--- a/deliveries/Apps_Users_OnBoarding_Script.sql
+++ b/deliveries/Apps_Users_OnBoarding_Script.sql
@@ -8,10 +8,10 @@ SET FOREIGN_KEY_CHECKS=1;
 INSERT INTO `fn_app` (`app_id`, `app_name`, `app_image_url`, `app_description`, `app_notes`, `app_url`, `app_alternate_url`, `app_rest_endpoint`, `ml_app_name`, `ml_app_admin_id`, `mots_id`, `app_password`, `open`, `enabled`, `thumbnail`, `app_username`, `ueb_key`, `ueb_secret`, `ueb_topic_name`, `app_type`,`auth_central`,`auth_namespace`) VALUES 
 (2, 'xDemo App', 'images/cache/portal-222865671_37476.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8990/ONAPPORTALSDK/welcome.htm', NULL, 'http://portal.api.simpledemo.onap.org:8990/ONAPPORTALSDK/api/v2', '', '', NULL, '2VxipM8Z3SETg32m3Gp0FvKS6zZ2uCbCw46WDyK6T5E=', 'N', 'Y', NULL, 'Default', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
 (3, 'DMaaP Bus Ctrl', 'images/cache/portal944583064_80711.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8989/ECOMPDBCAPP/dbc#/dmaap', NULL, 'http://portal.api.simpledemo.onap.org:8989/ECOMPDBCAPP/api/v2', '', '', NULL, 'okYTaDrhzibcbGVq5mjkVQ==', 'N', 'N', NULL, 'Default', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
-(4, 'SDC', 'images/cache/portal956868231_53879.png', NULL, NULL, 'http://sdc.api.simpledemo.onap.org:8181/sdc1/portal', NULL, 'http://sdc.api.simpledemo.onap.org:8080/api/v2', '', '', NULL, 'j85yNhyIs7zKYbR1VlwEfNhS6b7Om4l0Gx5O8931sCI=', 'N', 'Y', NULL, 'Default', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL), 
+(4, 'SDC', 'images/cache/portal956868231_53879.png', NULL, NULL, 'http://sdc.api.simpledemo.onap.org:8181/sdc1/portal', NULL, 'http://sdc.api.simpledemo.onap.org:8080/api/v3', '', '', NULL, 'j85yNhyIs7zKYbR1VlwEfNhS6b7Om4l0Gx5O8931sCI=', 'N', 'Y', NULL, 'sdc', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL), 
 (5, 'Policy', 'images/cache/portal1470452815_67021.png', NULL, NULL, 'http://policy.api.simpledemo.onap.org:8443/onap/policy', NULL, 'http://policy.api.simpledemo.onap.org:8443/onap/api/v2', '', '', NULL, '2VxipM8Z3SETg32m3Gp0FvKS6zZ2uCbCw46WDyK6T5E', 'N', 'Y', NULL, 'Default', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
 (6, 'Virtual Infrastructure Deployment', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'https://vid.api.simpledemo.onap.org:8443/vid/welcome.htm', NULL, 'http://vid.api.simpledemo.onap.org:8080/vid/api/v2', '', '', NULL, '2VxipM8Z3SETg32m3Gp0FvKS6zZ2uCbCw46WDyK6T5E', 'N', 'Y', NULL, 'Default', '2Re7Pvdkgw5aeAUD', 'S31PrbOzGgL4hg4owgtx47Da', 'ECOMP-PORTAL-OUTBOX-90', 1,'N',NULL),
-(7, 'A&AI UI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://aai.api.simpledemo.onap.org:9517/services/aai/webapp/index.html#/viewInspect', NULL, 'http://aai.api.simpledemo.onap.org:9517/api/v2', '', '', NULL, 't1oqm6wCXrGUXUSL8mS7pQ==', 'N', 'Y', NULL, 'aaiui', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
+(7, 'A&AI UI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://aai.api.simpledemo.onap.org:9517/services/aai/webapp/index.html#/viewInspect', NULL, 'http://aai.api.simpledemo.onap.org:9517/api/v2', '', '', NULL, '4LK69amiIFtuzcl6Gsv97Tt7MLhzo03aoOx7dTvdjKQ=', 'N', 'Y', NULL, 'aaiui', 'ueb_key', 'ueb_secret', 'ECOMP-PORTAL-OUTBOX', 1,'N',NULL),
 (8, 'CLI', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://portal.api.simpledemo.onap.org:8080/', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 1,'N',NULL),
 (9, 'MSB', 'images/cache/portal-345993588_92550.png', NULL, NULL, 'http://msb-iag:80/iui/microservices/index.html', NULL, NULL, '', '', NULL, '', 'Y', 'Y', NULL, '', '', '', '', 2,'N',NULL);
 
-- 
cgit 1.2.3-korg

