From d9007d680d19734d5dc106479784c420236cca4b Mon Sep 17 00:00:00 2001
From: Ravindra Bakkamanthala <rb7147@att.com>
Date: Wed, 31 May 2017 15:54:24 -0400
Subject: [Policy-17] Removed the sql scripts from sdk app

Change-Id: I5b017aad569014c7f12eab35e1dbd1c215f90ebe
Signed-off-by: Ravindra Bakkamanthala <rb7147@att.com>
---
 .../db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql  | 18 ------------------
 1 file changed, 18 deletions(-)
 delete mode 100644 ECOMP-SDK-APP/db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql

(limited to 'ECOMP-SDK-APP/db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql')

diff --git a/ECOMP-SDK-APP/db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql b/ECOMP-SDK-APP/db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql
deleted file mode 100644
index d633a2146..000000000
--- a/ECOMP-SDK-APP/db-scripts/EcompSdkMySql_Upgrade_1702_to_1707.sql
+++ /dev/null
@@ -1,18 +0,0 @@
--- ---------------------------------------------------------------------------------------------------------------
--- This script upgrades the ECOMP SDK App database from version 1702 to 1707.
--- For use by partner apps to be compatible with changes for the open-source release.
---
--- rename 2 columns, change size on 3 name columns from fn_user for the AT&T Opensource version
---
--- ---------------------------------------------------------------------------------------------------------------
-
-USE ecomp_sdk;
-
-alter table fn_user
-	CHANGE COLUMN FIRST_NAME FIRST_NAME VARCHAR(50) NULL DEFAULT NULL ,
-	CHANGE COLUMN MIDDLE_NAME MIDDLE_NAME VARCHAR(50) NULL DEFAULT NULL ,
-	CHANGE COLUMN LAST_NAME LAST_NAME VARCHAR(50) NULL DEFAULT NULL,
-	CHANGE COLUMN SBCID ORG_USER_ID VARCHAR(20) NULL DEFAULT NULL,
-	CHANGE COLUMN MANAGER_ATTUID ORG_MANAGER_USERID VARCHAR(20) NULL DEFAULT NULL;
-
-commit;
-- 
cgit 1.2.3-korg

