//
// ============LICENSE_START=======================================================
//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
// ================================================================================
// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
// 
// SPDX-License-Identifier: CC-BY-4.0
// ============LICENSE_END=========================================================
//
// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
//

== The APEX Full Client
The APEX Full Client combines the REST Editor, the Monitoring Client, and the Deployment Client into a single application.
The standard way to use the APEX Full Client is via an installation of the __war__ file on a webserver.
However, the Full Client can also be started via command line.
This will start a Grizzly webserver with the __war__ deployed.
Access to the Full Client is then via the provided URL 

On UNIX and Cygwin systems use:

- `apexApps.sh full-client` - simply starts the webserver with the Full Client

On Windows systems use:

- `apexApps.bat full-client` - simply starts the webserver with the Full Client


The option `-h` provides a help screen with all command line arguments.

[source%nowrap,sh]
----
usage: org.onap.policy.apex.services.client.full.rest.ApexServicesRestMain [options...]
-h,--help                         outputs the usage of this command
-p,--port <PORT>                  port to use for the Apex Services REST calls
-t,--time-to-live <TIME_TO_LIVE>  the amount of time in seconds that the server will run for before terminating
----

If the Full Client is started without any arguments the final messages will look similar to this:

[source%nowrap,sh]
----
INFO: [HttpServer] Started.
Apex Editor REST endpoint (ApexServicesRestMain: Config=[ApexServicesRestParameters: URI=http://localhost:18989/apexservices/, TTL=-1sec], State=RUNNING) started at http://localhost:18989/apexservices/
----

The last line states the URL on which the Monitoring Client can be accessed.
The example above stated `http://localhost:18989/apexservices`.
In a web browser use the URL `http://localhost:18989`.

