//
// ============LICENSE_START=======================================================
//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
// ================================================================================
// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
// 
// SPDX-License-Identifier: CC-BY-4.0
// ============LICENSE_END=========================================================
//
// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
//

== Link Monitor

The Link Monitor is a Python script.
At startup, it sends the context events to APEX to initialize the topology and the customers.
Then it takes events from Kafka and sends them to APEX.

.Link Monitor
[source,python,options="nowrap"]
----
include::{adsite-examples-pcvs-dir}/main/resources/examples/scripts/pcvs/vpnsla/LinkMonitor.py[Link Monitor]
----
