From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../src/site-docs/adoc/fragments/run-echo.adoc     | 79 ----------------------
 1 file changed, 79 deletions(-)
 delete mode 100644 tools/simple-wsclient/src/site-docs/adoc/fragments/run-echo.adoc

(limited to 'tools/simple-wsclient/src/site-docs/adoc/fragments/run-echo.adoc')

diff --git a/tools/simple-wsclient/src/site-docs/adoc/fragments/run-echo.adoc b/tools/simple-wsclient/src/site-docs/adoc/fragments/run-echo.adoc
deleted file mode 100644
index 213b4acbc..000000000
--- a/tools/simple-wsclient/src/site-docs/adoc/fragments/run-echo.adoc
+++ /dev/null
@@ -1,79 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== Run the Websocket Echo Client
-
-The echo client is included in an APEX full installation.
-To run the client, open a new shell (Unix, Cygwin) or command prompt (`cmd` on Windows).
-Then use the APEX application launcher to start the client.
-
-[IMPORTANT]
-.APEX engine needs to run first
-====
-The example assumes that an APEX engine configured for __produce__ carrier technology Websocket and __JSON__ event protocol is executed first.
-====
-
-
-[width="100%",options="header",cols="5a,5a"]
-|====================
-| Unix, Cygwin | Windows
-|
-[source%nowrap,sh]
-----
-# $APEX_HOME/bin/apexApps.sh ws-echo [args]
-----
-|
-[source%nowrap,bat]
-----
-> %APEX_HOME%\bin\apexApps.bat ws-echo [args]
-----
-|====================
-
-Use the following command line arguments for server and port of the Websocket server.
-The port should be the same as configured in the APEX engine.
-The server host should be the host on which the APEX engine is running
-
-- `-p` defines the Websocket port to connect to (defaults to `8887`)
-- `-s` defines the host on which a Websocket server is running (defaults to `localhost`)
-
-Let's assume that there is an APEX engine running, configured for produce Websocket carrier technology, as server, for port 42452, with produce event protocol JSON,.
-If we start the console client on the same host, we can omit the `-s` options.
-We start the console client as:
-
-[source%nowrap,bat]
-----
-# $APEX_HOME/bin/apexApps.sh ws-echo -p 42452 <1>
-> %APEX_HOME%\bin\apexApps.bat ws-echo -p 42452 <2>
-----
-<1> Start client on Unix or Cygwin
-<2> Start client on Windows
-
-Once started successfully, the client will produce the following messages (assuming we used `-p 42452` and an APEX engine is running on `localhost` with the same port:
-
-[source%nowrap,bat]
-----
-
-
-ws-simple-echo: starting simple event echo
- --> server: localhost
- --> port: 42452
-
-Once started, the application will simply print out all received events to standard out.
-Each received event will be prefixed by '---' and suffixed by '===='
-
-
-ws-simple-echo: opened connection to APEX (Web Socket Protocol Handshake)
-
-
-----
-
-- 
cgit 1.2.3-korg

