From a41c877a6b1980e0e866699633e0289d9a3fdbb5 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@ericsson.com>
Date: Wed, 5 Sep 2018 15:46:31 +0100
Subject: Fix package of apex examples and documents

The examples are not packaged correctly in the apex build
and the client wars are missing

The links and location of the documents are corrected.

Some POM duplicate dependencies removed.

Javadoc warnings removed.

Issue-ID: POLICY-867
Change-Id: I555c29191c61c0a9887365d95005dbc584eddf04
Signed-off-by: liamfallon <liam.fallon@ericsson.com>
---
 src/site-docs/adoc/fragments/install-guide/get-source.adoc | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'src/site-docs/adoc/fragments/install-guide/get-source.adoc')

diff --git a/src/site-docs/adoc/fragments/install-guide/get-source.adoc b/src/site-docs/adoc/fragments/install-guide/get-source.adoc
index 11786da4e..0aa97db1e 100644
--- a/src/site-docs/adoc/fragments/install-guide/get-source.adoc
+++ b/src/site-docs/adoc/fragments/install-guide/get-source.adoc
@@ -12,16 +12,16 @@
 //
 
 == Get the APEX Source Code
-The APEX source code is hosted in as project on Github link:https://github.com/Ericsson/apex[Ericsson:apex].
+
+The first APEX source code was hosted on Github in January 2018.
+By the end of 2018, APEX was added as a project in the ONAP Policy Framework, released later in the ONAP Casablanca release.
+
+The APEX source code is hosted in ONAP as project APEX.
 The current stable version is in the master branch.
-Simply clone the master branch from Github using either HTTPS (first example below) or SSH (second example below).
+Simply clone the master branch from ONAP using HTTPS.
 
 [source%nowrap,sh,numbered]
 ----
-git clone https://github.com/Ericsson/apex.git
+git clone https://gerrit.onap.org/r/policy/apex-pdp
 ----
 
-[source%nowrap,sh,numbered]
-----
-git clone git@github.com:Ericsson/apex.git
-----
-- 
cgit 1.2.3-korg

