From a41c877a6b1980e0e866699633e0289d9a3fdbb5 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@ericsson.com>
Date: Wed, 5 Sep 2018 15:46:31 +0100
Subject: Fix package of apex examples and documents

The examples are not packaged correctly in the apex build
and the client wars are missing

The links and location of the documents are corrected.

Some POM duplicate dependencies removed.

Javadoc warnings removed.

Issue-ID: POLICY-867
Change-Id: I555c29191c61c0a9887365d95005dbc584eddf04
Signed-off-by: liamfallon <liam.fallon@ericsson.com>
---
 src/site-docs/adoc/fragments/install-guide/configure.adoc | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'src/site-docs/adoc/fragments/install-guide/configure.adoc')

diff --git a/src/site-docs/adoc/fragments/install-guide/configure.adoc b/src/site-docs/adoc/fragments/install-guide/configure.adoc
index 77c63a29a..97388f8f7 100644
--- a/src/site-docs/adoc/fragments/install-guide/configure.adoc
+++ b/src/site-docs/adoc/fragments/install-guide/configure.adoc
@@ -56,14 +56,14 @@ The last row explains how to set those variables permanently.
 [source%nowrap,bash,numbered]
 ----
 # export APEX_USER=apexuser
-# cd /opt/ericsson/apex/apex
+# cd /opt/app/policy/apex-pdp/apex-pdp
 # export APEX_HOME=`pwd`
 ----
 
 [source%nowrap,tcsh,numbered]
 ----
 # setenv APEX_USER apexuser
-# cd /opt/ericsson/apex/apex
+# cd /opt/app/policy/apex-pdp/apex-pdp
 # setenv APEX_HOME `pwd`
 ----
 |
@@ -77,7 +77,7 @@ The last row explains how to set those variables permanently.
 ----
 # env \| grep APEX
 APEX_USER=apexuser
-APEX_HOME=/opt/ericsson/apex/apex
+APEX_HOME=/opt/app/policy/apex-pdp/apex-pdp
 ----
 |
 [source%nowrap,bat,numbered,subs="attributes+"]
@@ -125,7 +125,7 @@ Configure the APEX logging settings to your requirements, for instance:
 Edit the file `$APEX_HOME/etc/logback.xml` for any required changes.
 To change the log directory change the line
 
-`<property name="VAR_LOG" value="/var/log/ericsson/apex/" />`
+`<property name="VAR_LOG" value="/var/log/onap/policy/apex-pdp/" />`
 
 to
 
@@ -148,8 +148,8 @@ This is important when APEX was installed manually or when the log directory was
 |
 [source%nowrap,sh,numbered]
 ----
-mkdir -p /var/log/ericsson/apex
-chown -R apexuser:apexuser /var/log/ericsson/apex
+mkdir -p /var/log/onap/policy/apex-pdp
+chown -R apexuser:apexuser /var/log/onap/policy/apex-pdp
 ----
 |
 [source%nowrap,bat,numbered,subs="attributes+"]
-- 
cgit 1.2.3-korg

