From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../adoc/fragments/install-guide/configure.adoc    | 160 ---------------------
 1 file changed, 160 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/install-guide/configure.adoc

(limited to 'src/site-docs/adoc/fragments/install-guide/configure.adoc')

diff --git a/src/site-docs/adoc/fragments/install-guide/configure.adoc b/src/site-docs/adoc/fragments/install-guide/configure.adoc
deleted file mode 100644
index 97388f8f7..000000000
--- a/src/site-docs/adoc/fragments/install-guide/configure.adoc
+++ /dev/null
@@ -1,160 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== System Configuration
-Once APEX is installed, a few configurations need to be done:
-
-- Create an APEX user and an APEX group (optional, if not installed using RPM and DPKG)
-- Create environment settings for `APEX_HOME` and `APEX_USER`, required by the start scripts
-- Change settings of the logging framework (optional)
-- Create directories for logging, required (execution might fail if directories do not exist or cannot be created)
-
-=== APEX User and Group
-On smaller installations and test systems, APEX can run as any user or group.
-
-However, if APEX is installed in production, we strongly recommend you set up a dedicated user for running APEX.
-This will isolate the execution of APEX to that user.
-We recommend you use the userid `apexuser` but you may use any user you choose.
-
-The following example, for UNIX, creates a group called `apexuser`, an APEX user called `apexuser`, adds the group to the user, and changes ownership of the APEX installation to the user.
-Substitute `<apex-dir>` with the directory where APEX is installed.
-
-[source%nowrap,sh,numbered]
-----
-# sudo groupadd apexuser
-# sudo useradd -g apexuser apexuser
-# sudo chwon -R apexuser:apexuser <apex-dir>
-----
-
-For other operating systems please consult your manual or system administrator.
-
-
-=== Environment Settings: APEX_HOME and APEX_USER
-The provided start scripts for APEX require two environment variables being set:
-
-- `APEX_USER` with the user under whos name and permission APEX should be started (Unix only)
-- `APEX_HOME` with the directory where APEX is installed (Unix, Windows, Cygwin)
-
-The first row in the following table shows how to set these environment variables temporary (assuming the user is `apexuser`).
-The second row shows how to verify the settings.
-The last row explains how to set those variables permanently.
-
-[width="100%",options="header",cols="5a,5a"]
-|====================
-| Unix, Cygwin (bash/tcsh) | Windows
-|
-[source%nowrap,bash,numbered]
-----
-# export APEX_USER=apexuser
-# cd /opt/app/policy/apex-pdp/apex-pdp
-# export APEX_HOME=`pwd`
-----
-
-[source%nowrap,tcsh,numbered]
-----
-# setenv APEX_USER apexuser
-# cd /opt/app/policy/apex-pdp/apex-pdp
-# setenv APEX_HOME `pwd`
-----
-|
-[source%nowrap,bat,numbered,subs="attributes+"]
-----
->set APEX_HOME=C:\apex\apex-full-{release-version}
-----
-
-|
-[source%nowrap,sh,numbered]
-----
-# env \| grep APEX
-APEX_USER=apexuser
-APEX_HOME=/opt/app/policy/apex-pdp/apex-pdp
-----
-|
-[source%nowrap,bat,numbered,subs="attributes+"]
-----
->set APEX_HOME
-APEX_HOME=\apex\apex-full-{release-version}
-----
-
-|====================
-
-
-==== Making Environment Settings Permanent (Unix, Cygwin)
-For a per-user setting, edit the a user's `bash` or `tcsh` settings in `~/.bashrc` or `~/.tcshrc`.
-For system-wide settings, edit `/etc/profiles` (requires permissions).
-
-
-==== Making Environment Settings Permanent (Windows)
-On Windows 7 do
-
-- Click on the *Start* Menu
-- Right click on *Computer*
-- Select *Properties*
-
-On Windows 8/10 do
-
-- Click on the *Start* Menu
-- Select *System*
-
-Then do the following
-
-- Select *Advanced System Settings*
-- On the *Advanced* tab, click the *Environment Variables* button 
-- Edit an existing variable, or create a new System variable: 'Variable name'="APEX_HOME", 'Variable value'="C:\apex\apex-full-{release-version}"
-
-For the settings to take effect, an application needs to be restarted (e.g. any open `cmd` window).
-
-
-
-=== Edit the APEX Logging Settings
-Configure the APEX logging settings to your requirements, for instance:
-
-- change the directory where logs are written to, or
-- change the log levels
-
-Edit the file `$APEX_HOME/etc/logback.xml` for any required changes.
-To change the log directory change the line
-
-`<property name="VAR_LOG" value="/var/log/onap/policy/apex-pdp/" />`
-
-to
-
-`<property name="VAR_LOG" value="/PATH/TO/LOG/DIRECTORY/" />`
-
-On Windows, it is recommended to change the log directory to:
-
-`<property name="VAR_LOG" value="C:/apex/apex-full-{release-version}/logs" />`
-
-Note: Be careful about when to use `\` vs. `/` as the path separator!
-
-
-=== Create Directories for Logging
-Make sure that the log directory exists.
-This is important when APEX was installed manually or when the log directory was changed in the settings (see above).
-
-[width="100%",options="header",cols="5a,5a"]
-|====================
-| Unix, Cygwin | Windows
-|
-[source%nowrap,sh,numbered]
-----
-mkdir -p /var/log/onap/policy/apex-pdp
-chown -R apexuser:apexuser /var/log/onap/policy/apex-pdp
-----
-|
-[source%nowrap,bat,numbered,subs="attributes+"]
-----
->mkdir C:\apex\apex-full-{release-version}\logs
-----
-|====================
-
-- 
cgit 1.2.3-korg

