From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../adoc/fragments/howto-logging/introduction.adoc | 39 ----------------------
 1 file changed, 39 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/howto-logging/introduction.adoc

(limited to 'src/site-docs/adoc/fragments/howto-logging/introduction.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-logging/introduction.adoc b/src/site-docs/adoc/fragments/howto-logging/introduction.adoc
deleted file mode 100644
index 0bc37c58d..000000000
--- a/src/site-docs/adoc/fragments/howto-logging/introduction.adoc
+++ /dev/null
@@ -1,39 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== Introduction to APEX Logging
-
-All APEX components make extensive use of logging using the logging façade link:https://www.slf4j.org/[SLF4J] with the backend link:https://logback.qos.ch/[Logback].
-Both are used off-the-shelve, so the standard documentation and configuration apply to APEX logging.
-For details on how to work with logback please see the link:https://logback.qos.ch/manual/index.html[logback manual].
-
-The APEX applications is the logback configuration file `$APEX_HOME/etc/logback.xml` (Windows: `%APEX_HOME%\etc\logback.xml`).
-The logging backend is set to no debug, i.e. logs from the logging framework should be hidden at runtime.
-
-The configurable log levels work as expected:
-
-- __error__ (or __ERROR__) is used for serious errors in the APEX runtime engine
-- __warn__ (or __WARN__) is used for warnings, which in general can be ignored but might indicate some deeper problems
-- __info__ (or __INFO__) is used to provide generally interesting messages for startup and policy execution
-- __debug__ (or __DEBUG__) provides more details on startup and policy execution
-- __trace__ (or __TRACE__) gives full details on every aspect of the APEX engine from start to end
-
-The loggers can also be configured as expected.
-The standard configuration (after installing APEX) uses log level __info__ on all APEX classes (components).
-
-The applications and scripts in `$APEX_HOME/bin` (Windows: `%APEX_HOME\bin`) are configured to use the logback configuration `$APEX_HOME/etc/logback.xml` (Windows: `%APEX_HOME\etc\logback.xml`).
-There are multiple ways to use different logback configurations, for instance:
-
-- Maintain multiple configurations in `etc`, for instance a `logback-debug.xml` for deep debugging and a `logback-production.xml` for APEX in production mode, then copy the required configuration file to the used `logback.xml` prior starting APEX
-- Edit the scripts in `bin` to use a different logback configuration file (only recommended if you are familiar with editing bash scripts or windows batch files)
-
-- 
cgit 1.2.3-korg

