From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../fragments/howto-logging/example-logic.adoc     | 64 ----------------------
 1 file changed, 64 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/howto-logging/example-logic.adoc

(limited to 'src/site-docs/adoc/fragments/howto-logging/example-logic.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-logging/example-logic.adoc b/src/site-docs/adoc/fragments/howto-logging/example-logic.adoc
deleted file mode 100644
index 8f22cb498..000000000
--- a/src/site-docs/adoc/fragments/howto-logging/example-logic.adoc
+++ /dev/null
@@ -1,64 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== Example Configuration for Logging Logic
-
-The following example shows a configuration that logs policy logic to standard out and a file (__info__).
-All other APEX components are logging to a file (__debug__)..
-This configuration an be used in a pre-production phase with the APEX engine still running in a separate terminal to monitor policy execution.
-This logback configuration is in the APEX installation as `etc/logback-logic.xml`.
-
-[source%nowrap,xml]
-----
-<configuration debug="false">
-    <statusListener class="ch.qos.logback.core.status.NopStatusListener" />
-
-    <contextName>Apex</contextName>
-    <property name="VAR_LOG" value="/var/log/onap/policy/apex-pdp/" />
-
-    <appender name="STDOUT" class="ch.qos.logback.core.ConsoleAppender">
-        <encoder>
-            <Pattern>%d %contextName [%t] %level %logger{36} - %msg%n</Pattern>
-        </encoder>
-    </appender>
-
-    <appender name="FILE" class="ch.qos.logback.core.FileAppender">
-        <file>${VAR_LOG}/apex.log</file>
-        <encoder>
-            <pattern>
-                %d %-5relative [procId=${processId}] [%thread] %-5level%logger{26} - %msg %n %ex{full}
-            </pattern>
-        </encoder>
-    </appender>
-
-    <appender name="POLICY_APPENDER_STDOUT" class="ch.qos.logback.core.ConsoleAppender">
-        <encoder>
-            <pattern>policy: %msg\n</pattern>
-        </encoder>
-    </appender>
-
-    <root level="error">
-        <appender-ref ref="STDOUT" />
-    </root>
-
-    <logger name="org.onap.policy.apex" level="debug" additivity="false">
-        <appender-ref ref="FILE" />
-    </logger>
-
-    <logger name="org.onap.policy.apex.executionlogging" level="info" additivity="false">
-        <appender-ref ref="POLICY_APPENDER_STDOUT" />
-        <appender-ref ref="FILE" />
-    </logger>
-</configuration>
-----
-
-- 
cgit 1.2.3-korg

