From a41c877a6b1980e0e866699633e0289d9a3fdbb5 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@ericsson.com>
Date: Wed, 5 Sep 2018 15:46:31 +0100
Subject: Fix package of apex examples and documents

The examples are not packaged correctly in the apex build
and the client wars are missing

The links and location of the documents are corrected.

Some POM duplicate dependencies removed.

Javadoc warnings removed.

Issue-ID: POLICY-867
Change-Id: I555c29191c61c0a9887365d95005dbc584eddf04
Signed-off-by: liamfallon <liam.fallon@ericsson.com>
---
 src/site-docs/adoc/fragments/howto-apex/full-client.adoc | 13 +++++++++----
 1 file changed, 9 insertions(+), 4 deletions(-)

(limited to 'src/site-docs/adoc/fragments/howto-apex/full-client.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-apex/full-client.adoc b/src/site-docs/adoc/fragments/howto-apex/full-client.adoc
index 97a18393b..4370d80ac 100644
--- a/src/site-docs/adoc/fragments/howto-apex/full-client.adoc
+++ b/src/site-docs/adoc/fragments/howto-apex/full-client.adoc
@@ -31,16 +31,21 @@ The option `-h` provides a help screen with all command line arguments.
 
 [source%nowrap,sh]
 ----
-usage: org.onap.policy.apex.services.client.full.rest.ApexServicesRestMain [options...]
--h,--help                         outputs the usage of this command
--p,--port <PORT>                  port to use for the Apex Services REST calls
--t,--time-to-live <TIME_TO_LIVE>  the amount of time in seconds that the server will run for before terminating
+usage: org.onap.policy.apex.client.full.rest.ApexServicesRestMain [options...]
+-h,--help                        outputs the usage of this command
+-p,--port <PORT>                 port to use for the Apex Services REST calls
+-t,--time-to-live <TIME_TO_LIVE> the amount of time in seconds that the server will run for before terminating
+
 ----
 
 If the Full Client is started without any arguments the final messages will look similar to this:
 
 [source%nowrap,sh]
 ----
+Apex Editor REST endpoint (ApexServicesRestMain: Config=[ApexServicesRestParameters: URI=http://localhost:18989/apexservices/, TTL=-1sec], State=READY) starting at http://localhost:18989/apexservices/ . . .
+Sep 05, 2018 11:28:28 PM org.glassfish.grizzly.http.server.NetworkListener start
+INFO: Started listener bound to [localhost:18989]
+Sep 05, 2018 11:28:28 PM org.glassfish.grizzly.http.server.HttpServer start
 INFO: [HttpServer] Started.
 Apex Editor REST endpoint (ApexServicesRestMain: Config=[ApexServicesRestParameters: URI=http://localhost:18989/apexservices/, TTL=-1sec], State=RUNNING) started at http://localhost:18989/apexservices/
 ----
-- 
cgit 1.2.3-korg

