From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../adoc/fragments/howto-apex/engine.adoc          | 69 ----------------------
 1 file changed, 69 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/howto-apex/engine.adoc

(limited to 'src/site-docs/adoc/fragments/howto-apex/engine.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-apex/engine.adoc b/src/site-docs/adoc/fragments/howto-apex/engine.adoc
deleted file mode 100644
index 79dfe20e9..000000000
--- a/src/site-docs/adoc/fragments/howto-apex/engine.adoc
+++ /dev/null
@@ -1,69 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== The APEX Engine
-The APEX engine can be started in different ways, depending your requirements.
-All scripts are located in the APEX __bin__ directory
-
-On UNIX and Cygwin systems use:
-
-- `apexEngine.sh` - this script will
-  ** Test if `$APEX_USER` is set and if the user exists, terminate with an error otherwise
-  ** Test if `$APEX_HOME` is set. If not set, it will use the default setting as `/opt/app/policy/apex-pdp/apex-pdp`.
-     Then the set directory is tested to exist, the script will terminate if not.
-  ** When all tests are passed successfully, the script will call `apexApps.sh` with arguments to start the APEX engine.
-- `apexApps.sh engine` - this is the general APEX application launcher, which will
-  ** Start the engine with the argument `engine`
-  ** Test if `$APEX_HOME` is set and points to an existing directory. If not set or directory does not exist, script terminates.
-  ** Not test for any settings of `$APEX_USER`.
-
-On Windows systems use `apexEngine.bat` and `apexApps.bat engine` respectively.
-Note: none of the windows batch files will test for `%APEX_USER%`.
-
-Summary of alternatives to start the APEX Engine:
-
-[width="100%",options="header",cols="5a,5a"]
-|====================
-| Unix, Cygwin | Windows
-|
-[source%nowrap,sh]
-----
-# $APEX_HOME/bin/apexEngine.sh [args]
-# $APEX_HOME/bin/apexApps.sh engine [args]
-----
-|
-[source%nowrap,bat]
-----
-> %APEX_HOME%\bin\apexEngine.bat [args]
-> %APEX_HOME%\bin\apexApps.bat engine [args]
-----
-|====================
-
-
-The APEX engine comes with a few CLI arguments for setting configuration and policy model.
-The configuration file is always required.
-The policy model file is only required if no model file is specified in the configuration, or if the specified model file should be over written.
-The option `-h` prints a help screen.
-
-[source%nowrap,sh]
-----
-usage: org.onap.policy.apex.service.engine.main.ApexMain [options...]
-options
--c,--config-file <CONFIG_FILE>  the full path to the configuration file to use, the configuration file must be a Json file
-                                containing the Apex configuration parameters
--h,--help                       outputs the usage of this command
--m,--model-file <MODEL_FILE>    the full path to the model file to use, if set it overrides the model file set in the
-                                configuration file
--v,--version                    outputs the version of Apex
-----
-
-- 
cgit 1.2.3-korg

