From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../adoc/fragments/howto-apex/eng-deployment.adoc  | 55 ----------------------
 1 file changed, 55 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/howto-apex/eng-deployment.adoc

(limited to 'src/site-docs/adoc/fragments/howto-apex/eng-deployment.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-apex/eng-deployment.adoc b/src/site-docs/adoc/fragments/howto-apex/eng-deployment.adoc
deleted file mode 100644
index fb19353b7..000000000
--- a/src/site-docs/adoc/fragments/howto-apex/eng-deployment.adoc
+++ /dev/null
@@ -1,55 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== The APEX Deployment Client
-The standard way to use the APEX Deployment Client is via an installation of the __war__ file on a webserver.
-However, the Deployment Client can also be started via command line.
-This will start a Grizzly webserver with the __war__ deployed.
-Access to the Deployment Client is then via the provided URL 
-
-On UNIX and Cygwin systems use:
-
-- `apexApps.sh eng-deployment` - simply starts the webserver with the Deployment Client
-
-On Windows systems use:
-
-- `apexApps.bat eng-deployment` - simply starts the webserver with the Deployment Client
-
-
-The option `-h` provides a help screen with all command line arguments.
-
-[source%nowrap,sh]
-----
-usage: org.onap.policy.apex.client.deployment.rest.ApexDeploymentRestMain [options...]
--h,--help                        outputs the usage of this command
--p,--port <PORT>                 port to use for the Apex Services REST calls
--t,--time-to-live <TIME_TO_LIVE> the amount of time in seconds that the server will run for before terminating
-
-----
-
-If the Deployment Client is started without any arguments the final messages will look similar to this:
-
-[source%nowrap,sh]
-----
-Apex Services REST endpoint (ApexDeploymentRestMain: Config=[ApexDeploymentRestParameters: URI=http://localhost:18989/apexservices/, TTL=-1sec], State=READY) starting at http://localhost:18989/apexservices/ . . .
-Sep 05, 2018 11:27:09 PM org.glassfish.grizzly.http.server.NetworkListener start
-INFO: Started listener bound to [localhost:18989]
-Sep 05, 2018 11:27:09 PM org.glassfish.grizzly.http.server.HttpServer start
-INFO: [HttpServer] Started.
-Apex Services REST endpoint (ApexDeploymentRestMain: Config=[ApexDeploymentRestParameters: URI=http://localhost:18989/apexservices/, TTL=-1sec], State=RUNNING) started at http://localhost:18989/apexservices/
-----
-
-The last line states the URL on which the Deployment Client can be accessed.
-The example above stated `http://localhost:18989/apexservices`.
-In a web browser use the URL `http://localhost:18989`.
-
-- 
cgit 1.2.3-korg

