From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 .../adoc/fragments/howto-apex/app-ws.adoc          | 45 ----------------------
 1 file changed, 45 deletions(-)
 delete mode 100644 src/site-docs/adoc/fragments/howto-apex/app-ws.adoc

(limited to 'src/site-docs/adoc/fragments/howto-apex/app-ws.adoc')

diff --git a/src/site-docs/adoc/fragments/howto-apex/app-ws.adoc b/src/site-docs/adoc/fragments/howto-apex/app-ws.adoc
deleted file mode 100644
index f11bdf277..000000000
--- a/src/site-docs/adoc/fragments/howto-apex/app-ws.adoc
+++ /dev/null
@@ -1,45 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== Application: Websocket Clients (Echo and Console)
-
-**Status: Production**
-
-The application launcher also provides a Websocket echo client and a Websocket console client.
-The echo client connects to APEX and prints all events it receives from APEX.
-The console client connects to APEX, reads input from the command line, and sends this input as events to APEX.
-
-[width="100%",options="header",cols="5a,5a"]
-|====================
-| Unix, Cygwin | Windows
-|
-[source%nowrap,sh]
-----
-# $APEX_HOME/bin/apexApps.sh ws-echo [args]
-# $APEX_HOME/bin/apexApps.sh ws-console [args]
-----
-|
-[source%nowrap,bat]
-----
-> %APEX_HOME%\bin\apexApps.bat ws-echo [args]
-> %APEX_HOME%\bin\apexApps.bat ws-console [args]
-----
-|====================
-
-The arguments are the same for both applications:
-
-- `-p` defines the Websocket port to connect to (defaults to `8887`)
-- `-s` defines the host on which a Websocket server is running (defaults to `localhost`)
-
-A discussion on how to use these two applications to build an APEX system is detailed HowTo-Websockets.
-
-- 
cgit 1.2.3-korg

