From 0cf967c0239a8ab9c8b8831b700b72d9a08f7b03 Mon Sep 17 00:00:00 2001
From: liamfallon <liam.fallon@est.tech>
Date: Fri, 16 Oct 2020 13:09:11 +0100
Subject: Remove apex asciidoc documents

Apex documentation has now all been ported to use the ONAP recommended
rst format. This review removes the old asciidoc documents.

Issue-ID: POLICY-2824
Change-Id: I562bd344cb7d6ff36e7d54bdb8f95e3b656468f8
Signed-off-by: liamfallon <liam.fallon@est.tech>
---
 BUILD.adoc | 109 -------------------------------------------------------------
 1 file changed, 109 deletions(-)
 delete mode 100755 BUILD.adoc

(limited to 'BUILD.adoc')

diff --git a/BUILD.adoc b/BUILD.adoc
deleted file mode 100755
index 388972e0f..000000000
--- a/BUILD.adoc
+++ /dev/null
@@ -1,109 +0,0 @@
-//
-// ============LICENSE_START=======================================================
-//  Copyright (C) 2016-2018 Ericsson. All rights reserved.
-// ================================================================================
-// This file is licensed under the CREATIVE COMMONS ATTRIBUTION 4.0 INTERNATIONAL LICENSE
-// Full license text at https://creativecommons.org/licenses/by/4.0/legalcode
-// 
-// SPDX-License-Identifier: CC-BY-4.0
-// ============LICENSE_END=========================================================
-//
-// @author Sven van der Meer (sven.van.der.meer@ericsson.com)
-//
-
-== Quick Guide: How to build APEX from source
-
-
-[IMPORTANT]
-.A Build needs Space
-====
-Building APEX requires approximately 2-3 GB of hard disc space, 1 GB for the actual build with full distribution and 1-2 GB for the downloaded dependencies
-====
-
-[IMPORTANT]
-.A Build requires Internet (for first build)
-====
-During the build, several (a lot) of Maven dependencies will be downloaded and stored in the configured local Maven repository.
-The first standard build (and any first specific build) requires Internet access to download those dependencies.
-====
-
-[IMPORTANT]
-.Building RPM distributions
-====
-RPM images are only build if the `rpm` package is installed (Unix).
-To install `rpm` run `sudo apt-get install rpm`, then build APEX.
-====
-
-
-
-=== Standard build
-
-A standard build will build all Maven projects, including the packages.
-It will not build the APEX site oand documentation.
-
-Note: APEX has a dependency to ONAP parent projects.
-You might need to adjust your Maven M2 settings.
-The most current settings can be found in the ONAP oparent repo: link:https://git.onap.org/oparent/plain/settings.xml[Settings].
-
-Without tests, takes about 6 minutes.
-
-----
-mvn install -DskipTests
-----
-
-With standard tests, takes about 10-15 minutes.
-
-----
-mvn install
-----
-
-With all tests (requires some database and other software installed).
-
-----
-mvn install -DapexAll
-----
-
-
-=== Building the HowTo with all details
-
-
-Build the APEX stand-alone documentation
-
-----
-mvn generate-resources -N -DapexDocs
-----
-
-Then open the HowTo in a browser, for example
-
-----
-firefox target/generated-docs/html/HowTo-Build-APEX.html
-----
-
-
-=== APEX Site
-
-Building a complete site workflow (start with cleaning your local site staging directory).
-
-[IMPORTANT]
-.Building a Site takes Time
-====
-Building and staging the APEX web site can take very long.
-The stand-alone documentation will take about 2 minutes.
-The sites for all modules and projects and the main APEX site can take between 10-30 minutes depending on your build machine
-(~10 minutes without generating source and test-source reports, closer to 30 minutes with all reports).
-====
-
-
-----
-mvn clean -DapexAll
-mvn install -DskipTests
-mvn generate-resources -N -DapexDocs
-mvn initialize site:attach-descriptor site site:stage -DapexSite
-----
-
-
-Terms & Conditions apply
-
-
-* * *
-*The ONAP APEX team*
-- 
cgit 1.2.3-korg

