From fbe4bb98345727d190cefcfb3ec54ad9075fba9d Mon Sep 17 00:00:00 2001
From: "RamaPrasad Amaranarayana (ra5425)" <ra5425@att.com>
Date: Wed, 19 Sep 2018 17:40:40 -0400
Subject: Change Management Schedule Optimization

Adding Robot Test Scripts for Change Management Schedule Optimization

Change-Id: Id5edf9d3fb3c2390791362692c8b25f7607045c6
Issue-ID: OPTFRA-352
Signed-off-by: RamaPrasad Amaranarayana (ra5425) <ra5425@att.com>
---
 cmso-robot/robot/assets/sql/InitDB.sql | 3 +++
 1 file changed, 3 insertions(+)
 create mode 100644 cmso-robot/robot/assets/sql/InitDB.sql

(limited to 'cmso-robot/robot/assets/sql/InitDB.sql')

diff --git a/cmso-robot/robot/assets/sql/InitDB.sql b/cmso-robot/robot/assets/sql/InitDB.sql
new file mode 100644
index 0000000..72667cb
--- /dev/null
+++ b/cmso-robot/robot/assets/sql/InitDB.sql
@@ -0,0 +1,3 @@
+INSERT INTO `scheduler`.`domains` (`domain`) VALUES ('ChangeManagement');
+INSERT INTO `scheduler`.`approval_types` (`domain`, `approval_type`, `approval_count`) VALUES ('ChangeManagement', 'Tier 2', '1');
+SET @@global.time_zone='+00:00';
\ No newline at end of file
-- 
cgit 1.2.3-korg

