From ee4c615ad3ba7fc41c71ec5cdf4a123f3c257fb9 Mon Sep 17 00:00:00 2001
From: Jerry Flood <jflood@att.com>
Date: Thu, 28 Mar 2019 05:51:38 -0400
Subject: Commit 1 for Define OPtimizer API mS

Multiple commits required due to commit size limitation.

Change-Id: I407ad479f3788dd4b8c783cbe4d615509cc9b2d1
Issue-ID: OPTFRA-437
Signed-off-by: Jerry Flood <jflood@att.com>
---
 .../src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql')

diff --git a/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql b/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
index 171cb2d..02daa60 100644
--- a/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
+++ b/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
@@ -13,7 +13,7 @@ DEFAULT CHARACTER SET = utf8;
 
 CREATE TABLE IF NOT EXISTS `optimizer`.`response` (
   uuid BINARY(16) NOT NULL,
-  repsonse LONGTEXT NULL DEFAULT NULL,
+  response LONGTEXT NULL DEFAULT NULL,
   delivered_time BIGINT(20) NULL DEFAULT NULL,
   PRIMARY KEY (`uuid`))
 ENGINE = InnoDB
-- 
cgit 1.2.3-korg

