From 6bb43b6c2696877ffd5040e9a75d5c0d66b3924b Mon Sep 17 00:00:00 2001
From: Jerry Flood <jflood@att.com>
Date: Sun, 31 Mar 2019 08:31:18 -0400
Subject: Commit 1 for Define OPtimizer API mS

Multiple commits required due to commit size limitation.

Change-Id: If34d19e3ed8bebcab1a348cbac39254336a456f9
Issue-ID: OPTFRA-437
Signed-off-by: Jerry Flood <jflood@att.com>
---
 .../src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql  | 1 +
 1 file changed, 1 insertion(+)

(limited to 'cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql')

diff --git a/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql b/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
index 02daa60..d91a17e 100644
--- a/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
+++ b/cmso-database/src/main/resources/optimizer-dbchanges/onap-optimizer-v1-schema.sql
@@ -7,6 +7,7 @@ CREATE TABLE IF NOT EXISTS `optimizer`.`request` (
   request_start BIGINT(20) NULL DEFAULT NULL,
   request_end BIGINT(20) NULL DEFAULT NULL,
   status VARCHAR(45) NULL DEFAULT NULL,
+  message MEDIUMTEXT NULL DEFAULT NULL,
   PRIMARY KEY (`uuid`))
 ENGINE = InnoDB
 DEFAULT CHARACTER SET = utf8;
-- 
cgit 1.2.3-korg

