From 0e1571aa50b192ec0d9881ce0a4fa8f6e683f47d Mon Sep 17 00:00:00 2001
From: Jerry Flood <jflood@att.com>
Date: Tue, 19 Mar 2019 07:19:56 -0400
Subject: Update changelogs for init containers

Issue-ID: OPTFRA-459

Change-Id: Ia8bb43cf9d2b1063d836d6af7a1ff188d900cda4
Signed-off-by: Jerry Flood <jflood@att.com>
---
 .../optimizer-dbchanges/onap-cmso-v1-schema.sql    | 51 ----------------------
 1 file changed, 51 deletions(-)
 delete mode 100644 cmso-database/src/main/resources/optimizer-dbchanges/onap-cmso-v1-schema.sql

(limited to 'cmso-database/src/main/resources/optimizer-dbchanges/onap-cmso-v1-schema.sql')

diff --git a/cmso-database/src/main/resources/optimizer-dbchanges/onap-cmso-v1-schema.sql b/cmso-database/src/main/resources/optimizer-dbchanges/onap-cmso-v1-schema.sql
deleted file mode 100644
index d6e225b..0000000
--- a/cmso-database/src/main/resources/optimizer-dbchanges/onap-cmso-v1-schema.sql
+++ /dev/null
@@ -1,51 +0,0 @@
-CREATE SCHEMA IF NOT EXISTS `optimizer` DEFAULT CHARACTER SET utf8 ;
-
-CREATE TABLE IF NOT EXISTS `optimizer`.`request` (
-  uuid BINARY(16) NOT NULL,
-  request LONGTEXT NOT NULL,
-  created_time BIGINT(20) NULL DEFAULT NULL,
-  request_start BIGINT(20) NULL DEFAULT NULL,
-  request_end BIGINT(20) NULL DEFAULT NULL,
-  status VARCHAR(45) NULL DEFAULT NULL,
-  PRIMARY KEY (`uuid`))
-ENGINE = InnoDB
-DEFAULT CHARACTER SET = utf8;
-
-CREATE TABLE IF NOT EXISTS `optimizer`.`response` (
-  uuid BINARY(16) NOT NULL,
-  repsonse LONGTEXT NULL DEFAULT NULL,
-  delivered_time BIGINT(20) NULL DEFAULT NULL,
-  PRIMARY KEY (`uuid`))
-ENGINE = InnoDB
-DEFAULT CHARACTER SET = utf8;
-
-
-CREATE TABLE IF NOT EXISTS `optimizer`.`topology` (
-  uuid BINARY(16) NOT NULL,
-  topology LONGTEXT NULL DEFAULT NULL,
-  topology_start BIGINT(20) NULL DEFAULT NULL,
-  topology_end BIGINT(20) NULL DEFAULT NULL,
-  topology_retries INT NULL DEFAULT NULL,
-  PRIMARY KEY (`uuid`))
-ENGINE = InnoDB
-DEFAULT CHARACTER SET = utf8;
-
-CREATE TABLE IF NOT EXISTS `optimizer`.`tickets` (
-  uuid BINARY(16) NOT NULL,
-  tickets LONGTEXT NULL DEFAULT NULL,
-  tickets_start BIGINT(20) NULL DEFAULT NULL,
-  tickets_end BIGINT(20) NULL DEFAULT NULL,
-  tickets_retries INT NULL DEFAULT NULL,
-  PRIMARY KEY (`uuid`))
-ENGINE = InnoDB
-DEFAULT CHARACTER SET = utf8;
-
-CREATE TABLE IF NOT EXISTS `optimizer`.`optimizer` (
-  uuid BINARY(16) NOT NULL,
-  optimize_response LONGTEXT NULL DEFAULT NULL,
-  optimize_start BIGINT(20) NULL DEFAULT NULL,
-  optimize_end BIGINT(20) NULL DEFAULT NULL,
-  optimize_retries INT NULL DEFAULT NULL,
-  PRIMARY KEY (`uuid`))
-ENGINE = InnoDB
-DEFAULT CHARACTER SET = utf8;
-- 
cgit 1.2.3-korg

