/* Copyright © 2017 AT&T, Amdocs, Bell Canada
*
* Licensed under the Apache License, Version 2.0 (the "License");
* you may not use this file except in compliance with the License.
* You may obtain a copy of the License at
*
*       http://www.apache.org/licenses/LICENSE-2.0
*
* Unless required by applicable law or agreed to in writing, software
* distributed under the License is distributed on an "AS IS" BASIS,
* WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
* See the License for the specific language governing permissions and
* limitations under the License.
*/

CREATE TABLE IF NOT EXISTS `vid_openecomp_epsdk`.`schema_info` (
   `SCHEMA_ID` VARCHAR(25) NOT NULL,
   `SCHEMA_DESC` VARCHAR(75) NOT NULL,
   `DATASOURCE_TYPE` VARCHAR(100) NULL DEFAULT NULL,
   `CONNECTION_URL` VARCHAR(200) NOT NULL,
   `USER_NAME` VARCHAR(45) NOT NULL,
   `PASSWORD` VARCHAR(45) NULL DEFAULT NULL,
   `DRIVER_CLASS` VARCHAR(100) NOT NULL,
   `MIN_POOL_SIZE` INT(11) NOT NULL,
   `MAX_POOL_SIZE` INT(11) NOT NULL,
   `IDLE_CONNECTION_TEST_PERIOD` INT(11) NOT NULL)
    ENGINE = InnoDB
    DEFAULT CHARACTER SET = utf8;
