From 2dda01daf2e5c2053221bf4eac81e2585f2b2c7f Mon Sep 17 00:00:00 2001
From: "Sonsino, Ofir (os0695)" <os0695@intl.att.com>
Date: Wed, 30 May 2018 18:41:14 +0300
Subject: VID Resiliency & Scalability

Change-Id: Ifc593e2e33c3430c74156b4b153263c11127bfa9
Issue-ID: VID-160
Signed-off-by: Michael Lando <ml636r@att.com>
---
 .../resources/config/lf_config/vid-pre-init.sql    | 28 ----------------------
 1 file changed, 28 deletions(-)
 delete mode 100644 kubernetes/vid/charts/mariadb/resources/config/lf_config/vid-pre-init.sql

(limited to 'kubernetes/vid/charts/mariadb/resources/config/lf_config/vid-pre-init.sql')

diff --git a/kubernetes/vid/charts/mariadb/resources/config/lf_config/vid-pre-init.sql b/kubernetes/vid/charts/mariadb/resources/config/lf_config/vid-pre-init.sql
deleted file mode 100644
index 8323a4ae86..0000000000
--- a/kubernetes/vid/charts/mariadb/resources/config/lf_config/vid-pre-init.sql
+++ /dev/null
@@ -1,28 +0,0 @@
-/* Copyright © 2017 AT&T, Amdocs, Bell Canada
-*
-* Licensed under the Apache License, Version 2.0 (the "License");
-* you may not use this file except in compliance with the License.
-* You may obtain a copy of the License at
-*
-*       http://www.apache.org/licenses/LICENSE-2.0
-*
-* Unless required by applicable law or agreed to in writing, software
-* distributed under the License is distributed on an "AS IS" BASIS,
-* WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
-* See the License for the specific language governing permissions and
-* limitations under the License.
-*/
-
-CREATE TABLE IF NOT EXISTS `vid_openecomp_epsdk`.`schema_info` (
-   `SCHEMA_ID` VARCHAR(25) NOT NULL,
-   `SCHEMA_DESC` VARCHAR(75) NOT NULL,
-   `DATASOURCE_TYPE` VARCHAR(100) NULL DEFAULT NULL,
-   `CONNECTION_URL` VARCHAR(200) NOT NULL,
-   `USER_NAME` VARCHAR(45) NOT NULL,
-   `PASSWORD` VARCHAR(45) NULL DEFAULT NULL,
-   `DRIVER_CLASS` VARCHAR(100) NOT NULL,
-   `MIN_POOL_SIZE` INT(11) NOT NULL,
-   `MAX_POOL_SIZE` INT(11) NOT NULL,
-   `IDLE_CONNECTION_TEST_PERIOD` INT(11) NOT NULL)
-    ENGINE = InnoDB
-    DEFAULT CHARACTER SET = utf8;
-- 
cgit 1.2.3-korg

