From 1d12388430a6112d86200fdabba1f156d6bf2ef6 Mon Sep 17 00:00:00 2001
From: Mandeep Khinda <mandeep.khinda@amdocs.com>
Date: Tue, 27 Mar 2018 01:26:59 +0000
Subject: Standardizing ONAP Portal

-synched up with Beijing (master)
-pods come up without cassandra music:
sed: couldn't edit /docker-entrypoint-initdb.d/\
zzz_portal.cql: not a regular file

ONAPPORTAL webapp in tomcat is failing to star
resulting in HTTP 404 robot health

Not sure how logging works in beijing so removed
some of the ubuntu-init dir creation.  need someone
familiar with logging to investigate

-addressed some CI comments.
-removing configmap now that portaldb was fixed

Issue-ID: OOM-746

Change-Id: I123d1ec6889db40b1721475a43665ef8efefc057
Signed-off-by: Mandeep Khinda <mandeep.khinda@amdocs.com>
---
 .../resources/config/mariadb/oom_updates.sql       | 23 ----------------------
 1 file changed, 23 deletions(-)
 delete mode 100644 kubernetes/portal/resources/config/mariadb/oom_updates.sql

(limited to 'kubernetes/portal/resources/config/mariadb/oom_updates.sql')

diff --git a/kubernetes/portal/resources/config/mariadb/oom_updates.sql b/kubernetes/portal/resources/config/mariadb/oom_updates.sql
deleted file mode 100644
index 1b6d43c07e..0000000000
--- a/kubernetes/portal/resources/config/mariadb/oom_updates.sql
+++ /dev/null
@@ -1,23 +0,0 @@
-/* Copyright © 2017 AT&T, Amdocs, Bell Canada
-*
-* Licensed under the Apache License, Version 2.0 (the "License");
-* you may not use this file except in compliance with the License.
-* You may obtain a copy of the License at
-*
-*       http://www.apache.org/licenses/LICENSE-2.0
-*
-* Unless required by applicable law or agreed to in writing, software
-* distributed under the License is distributed on an "AS IS" BASIS,
-* WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
-* See the License for the specific language governing permissions and
-* limitations under the License.
-*/
-
-USE portal;
-/*
-Any updates required by OOM to the portaldb are made here.
-1. split up SDC-FE and SDC-BE.  Originally both FE and BE point to the same IP
-while the OOM K8s version has these service split up.
-*/
-UPDATE fn_app SET app_rest_endpoint = 'http://sdc.api.be.simpledemo.onap.org:8080/api/v2' where app_name = 'SDC';
-UPDATE fn_app SET app_url = 'http://cli.api.simpledemo.onap.org:8080', app_type = 1 where app_name='CLI';
-- 
cgit 1.2.3-korg

